TESPLA04.XLS -----------------------------------------MSSL XMM Optical Monitor Test Plan Summary

EOB-2 Vibration Thermal Thermal Static EMC Function Optical Lifetest Cleanliness

Vacuum Balance Load Calibration check XMM-OM 8.1.1 8.1.1 TM 8.2.1 8.2.1 Telescope 8.3.1 8.3.1 primary mirror assy 8.4.1 8.4.1 secondary mirror assy 8.5.1 8.5.1 Blue Module 8.6.1

blue camera head 8.7.1 filter wheel 8.8.1 8.8.1 dichroic 8.9.1 8.9.1 blue processing electronics 8.10.1 internal harness 8.11.1 TMPSU DEM 8.19.1 Data Processing Unit 8.20.1 Instrument Control Unit 8.21.1 DEM PSU 8.22.1 enclosure 8.23.1 External Harness 8.24.1

Fig 1

EQM Vibration Thermal Thermal Static EMC Function Optical Lifetest Cleanliness

Vacuum Balance Load Calibration check XMM-OM 7.1.2 7.1.2 7.1.2 7.1.2 7.1.2 7.1.2 7.1.2 TM 7.2.2

Telescope 7.3.2

primary mirror assy 7.4.2 7.4.2 7.4.2 secondary mirror assy 7.5.2 7.5.2 7.5.2 Blue Module 7.6.2 7.6.2 7.6.2 7.6.2 7.6.2 7.6.2 blue camera head 7.7.2 filter wheel 7.8.2 dichroic 7.9.2 blue processing electronics 7.10.2 internal harness 7.11.2 TMPSU 7.16.2 7.16.2 7.16.2 7.16.2 DEM 7.19.2 7.19.2 7.19.2 7.19.2 Data Processing Unit 7.20.2 Instrument Control Unit 7.21.2 DEM PSU 7.22.2 enclosure 7.23.2 External Harness 7.24.2

Fig 2

TESPLA04.XLS

TESPLA04.XLS

EM Vibration Thermal Thermal Static EMC Function Optical Lifetest Cleanliness

Vacuum Balance Load Calibration check XMM-OM 8.1.3 TM Telescope

primary mirror assy secondary mirror assy Blue Module 8.6.3

blue camera head 8.7.3 filter wheel 8.8.3 dichroic 8.9.3 blue processing electronics 8.10.3 internal harness 8.11.3 TMPSU DEM 8.19.3 8.19.3

Data Processing Unit 8.20.3 Instrument Control Unit 8.21.3 DEM PSU 8.22.3 enclosure 8.23.3 External Harness 8.24.3

Fig 3

FM/FS Vibration Thermal Thermal Static EMC Function Optical Lifetest Cleanliness

Vacuum Balance Load Calibration check XMM-OM 8.1.4 8.1.4 8.1.4 8.1.4 8.1.4 8.1.4 8.1.4 TM 8.2.4 8.2.4 Telescope 8.3.4 8.3.4 primary mirror assy 8.4.4 8.4.4 8.4.4 secondary mirror assy 8.5.4 8.5.4 8.5.4 Blue Module 8.6.4 8.6.4 8.6.4 8.6.4 8.6.4 8.6.4 blue camera head 8.7.4 8.7.4 filter wheel 8.8.4 8.8.4 dichroic 8.9.4 8.9.4 blue processing electronics 8.10.4 8.10.4 internal harness 8.11.4 8.11.4 TMPSU 8.16.4 8.16.4 8.16.4 8.16.4 8.16.4 DEM 8.19.4 8.19.4 8.19.4 8.19.4 8.19.4 Data Processing Unit 8.20.4 8.20.4 Instrument Control Unit 8.21.4 8.21.4 DEM PSU 8.22.4 8.22.4 enclosure 8.23.4 8.23.4 External Harness 8.24.4 8.24.4

Fig 4

TESPLA04.XLS

TESPLA04.XLS

STM Vibration Thermal Thermal Static EMC Function Optical Lifetest Cleanliness

Vacuum Balance Load Calibration check XMM-OM TM Telescope

primary mirror assy secondary mirror assy Blue Module

blue camera head filter wheel dichroic blue processing electronics internal harness TMPSU DEM 8.25 8.25 8.25 8.25 8.25 Data Processing Unit Instrument Control Unit DEM PSU enclosure External Harness 8.25

Fig 5