OM3 Declared Component List XMM-OM/MSSL/SP/0133.01 3

F:\APD\DOCS\SP\OM3STMDCL01.DOC

1. INTRODUCTION This document identifies the component types that will be used in the External Harness for the Optical Monitor (OM3). The data is based on firm designs and is now practically complete. The components shown are accompanied by their flight specifications. Those used for the STM may be vacuum compatible devices to Military specifications.

2. REFERENCE DOCUMENTS XMM-OM/MSSL/SP/0031 Product Assurance Plan ESA PSS-01-60 Component Selection, Procurement and Control for ESA Space Systems ESA/SCC 20100 Basic Specification Requirements for the Qualification of Standard Electronic Components for Space XMM PX-RS-0017 Product Assurance Requirements for XMM Experiments

3. QUALITY LEVELS Component selection and quality levels shall be as described in the PA Plan XMM- OM/MSSL/SP/0031.

4. TABLE DESCRIPTION The format of the following table is as used in MSSL for identifying the types of components used, and the assemblies where they are used. It has been truncated just to show the component types and quantities.

OM3 Declared Component List XMM-OM/MSSL/SP/0133.01 2

F:\APD\DOCS\SP\OM3STMDCL01.DOC

CHANGE RECORD

ISSUE DATE PAGES CHANGED COMMENTS

01 15 April 1997 All New

CONTENTS

1. INTRODUCTION

2. REFERENCE DOCUMENTS

3. QUALITY LEVELS

4. TABLE DESCRIPTION

XMM Optical Monitor

MULLARD SPACE SCIENCE LABORATORY UNIVERSITY COLLEGE LONDON Author: A P Dibbens

OM3 DECLARED COMPONENT LIST

Document Number: XMM-OM/MSSL/SP/0133.01 15 April 1997

Distribution:

XMM-OM Project Office R Hunt Orig.

ESA PX H Eggel

CSL P Rochus S. Roose

UCSB T Sasseen

Royal Greenwich Observatory R Bingham

University College London J Fordham

Mullard Space Science Laboratory N Bray R Card M Carter R Chaudery A Dibbens H Huckle H Kawakami T Patrick D Self P Smith P Thomas M Whillock

K Mason A Smith

Author: Date:

OM Project Office Date:

Distributed: Date: