X MM Optical Monitor

MULLARD SPACE SCIENCE LABORATORY

UNIVERSITY COLLEGE LONDON Authors: P J Smith, H.E.Huckle

SOFTWARE STATUS FOR THE FM

Document Number: XMM - OM/MSSL/SP/0170.0 10

Distribution:

XMM - OM Project Office A Dibbens Orig.

ESA PX H Eggel

CSL P Rochus

S. Roose

Los Alamos National Laboratory C Ho

UCSB T Sasseen

Royal Greenwich Observatory R Bingham

UniversityCollege London J Fordham

Mullard Space Science Laboratory R Card

M Carter

R C haudery

R Hunt

M Whillock

H Huckle

H Kawakami

T Kennedy

D Self

P Smith

P Thomas

S Collier

K Mason

A Smith

Author: Date:

OM Project Office Date:

Distributed: Date:

ii

CHANGE RECORD

ISSUE DATE PAGE S CHANGED COM M ENTS

01 30 May1998 All New

02 14 August 1998 All Major revision

03 16 August1998 All Major revision

04 18 Sep 1998 All Safe Mode added, prime and redundant code merged.

Heater Algorithmrevised.

05 25 Sep 1998 All Software modifica tion summaryadded

06 1 Oct 1998 Section 2 Revision to Modification Summaryof release 5

07 23 - Dec - 1998 All Revision summaryfor release 7.

08 26 - Mar - 1999 All Revision summaryfor release 8.

09 19 - Apr 1999 All Revision summaryfor release 9

09b 1 - Oct - 1999 All Revision summaryfor release 9B

09b 7 - Oct - 1999 All Re - issued with omissions added!

10 12 - May - 2000 All Revision summaryfor release 10 , added operational considerations sections iii

CONTENTS

1. INTRODUCTION ................................ ................................ ................................ ..... 1

2. CODE MODIFICATION SUMMARY ................................ ................................ ............. 1

2.1 M odifications between Release 3 and Release 4 ................................ ................................ ................................ ... 1

ICU Code ................................ ................................ ................................ ................................ ................................ .... 1

DPU Code ................................ ................................ ................................ ................................ ................................ ... 1

2.2 M odifications between Release 4 and Release 5 ................................ ................................ ................................ ... 2

ICU Code ................................ ................................ ................................ ................................ ................................ .... 2

DPU Code ................................ ................................ ................................ ................................ ................................ ... 2

2.3 M odifications between Release 5 and Release 6 ................................ ................................ ................................ ... 2

2.4 M odifications between Re lease 6 and Release 7 ................................ ................................ ................................ ... 3

ICU ................................ ................................ ................................ ................................ ................................ .............. 3

DPU ................................ ................................ ................................ ................................ ................................ ............ 3

2.8 M odifications between Release 7 and Release 8 ................................ ................................ ............................. 4

ICU ................................ ................................ ................................ ................................ ................................ .............. 4

DPU ................................ ................................ ................................ ................................ ................................ ............ 4

2.6 . M odifications between Release 8 and Release 9B. ................................ ................................ ............................. 5

ICU ................................ ................................ ................................ ................................ ................................ .............. 5

DPU ................................ ................................ ................................ ................................ ................................ ............ 5

2.7 M odifications between Release 9B and Release 10 ................................ ................................ .............................. 6

ICU ................................ ................................ ................................ ................................ ................................ .............. 6

DPU ................................ ................................ ................................ ................................ ................................ ............ 6

2.8 .Outstanding NCR´s and ECR´s. ................................ ................................ ................................ ........................... 7

2.9 Operational Implications of Release 10 ................................ ................................ ................................ ................. 8

2.9.1 NCRs and ECRs to be closed. ................................ ................................ ................................ ............................ 8

2.9.2 NCRs and ECRs remaining Open ................................ ................................ ................................ ...................... 9

2.9.3 Other Considerations ................................ ................................ ................................ ................................ ........ 10

3. BASIC MODE ADA CODE ................................ ................................ ................................ ................................ .... 11

4. OPERATIONAL MODE ADA CODE ................................ ................................ ......... 15

5. DPU CODE ................................ ................................ ................................ ................ 20

6. LOADABLE CODE ................................ ................................ ................................ .... 28

1

1. INTRODUCTION

T his document contains all the software files and their version numbers used for Basic Mode and Operational Mode for the ICU and the DPU code for the Optical Monitor FM.

All the files are kept under version control using cvs.

T here is a Makefile for each set of ICU source code files for use w ith GNU make and a series of makefiles and scripts for the DPU source code.

See also the following documents:

XMM - OM/UCSB/T C/0043, Description of DPU flight software changes 1/99 ˘ 3/99 and

XMM - OM/UCSB/RP/0003 DPU Flight Software T esting Report fo r Release 8

2. CODE MODIFICATION SUMMARY

2.1 Modifications between Release 3 and Release 4

ICU Code

Reference Comments

OM - MSSL - ECR - 69 Autonomous Safing task removed as it would not have been able to respond quicklyenough, and there are hardware HV prot ections anyway

OM - MSSL - ECR - 71 T he prime and redundant code is nowidentical. T he code decides whether it is running on prime or redundant.

OM - MSSL - NCR - 69 ICU nowignores swap unit status in DPU status word when DPU is in `boot´ mode as this value is inc orrect.

OM - MSSL - NCR - 97 Incorrect loading of WindowT able removed.

OM - MSSL - NCR - 98 Alert in the event of unexpected DPU reset added.

OM - MSSL - NCR - 99 DPU Power down command nowworks.

OM - MSSL - NCR - 100 Command rejected if attempt is made to move filter wheel while it is still moving.

OM - MSSL - NCR - 101 Command rejected if attempt is made to move filter wheel to an absolute position before the datumhas been found.

OM - MSSL - NCR - 102 Filter Wheel nowmoves slowlywhen seeking datumwhen near coarse sensor to preve nt occasional failure to find datum.

OM - MSSL - NCR - 103 It should nowbe impossible to have both automatic and contingencyheater tasks running together.

OM - MSSL - NCR - 104 Default heater control on start - up of operational mode are nowthe closed loop rather t han the open loop algorithms.

OM - MSSL - NCR - 105 Going to Safe Mode in Operational Mode now`safes´ the high voltages and filter wheel.

OM - MSSL - NCR - 106 Additional `Intermediate Safe´ mode command added, `Safing level´ modifier in command removed.

OM - MSSL - N CR - 107 Memorydump of detector electronics nowworks.

OM - MSSL - NCR - 110 Filter wheel `Bar´ position nowat 2100 (as per changed specification).

DPU Code

T here were no modifications to the DPU code.

2

2.2 Modifications between Release 4 and Release 5

ICU Cod e

Reference Comments

OM - MSSL - ECR - 61 HV MCP1 nowallowed to rise even if MCP23 not > 1100V (redundant only)

OM - MSSL - NCR - 83 Irregular HK ˘ nowevery10 s

OM - MSSL - NCR - 84 Incorrect heater status in HK fixed

OM - MSSL - NCR - 87 Filter sometimes did not show`Un known´ position prior to finding datum ˘ fixed

OM - MSSL - NCR - 88 Closed loop control of interface temperature nowuses an average of the main, reference B and Reference C thermistors as its monitoring temperature. T his is to be consistent with software used at CSL during thermal balance test.

DPU Code

Reference Comments

OM - MSSL - ECR - 67 Preliminarycode for the real - time raw - data mode was added but can be completely turned off.

OM - MSSL - ECR - 70 Science and memorywindows reset to zero before configuring for each exposure.

OM - MSSL - NCR - 90 DPU crashes with heavywhite dsp activity, especiallyduring compression and data output

˘ caused byerror in white swap unit code and FEC code screening ˘ nowfixed.

OM - MSSL - NCR - 91 DPU crashes in engineering mode 4 with complex images ˘ caused bythe compressed data buffer watermark not being set, nowset.

OM - MSSL - NCR - 92 Global memoryaddress zero was corrupted after blue event processing ˘ caused by incorrect exiting of bad event address error handler ˘ nowfixed.

OM - MSSL - NCR - 93 Bad event address ˘ due to blue event ping/pong address wrong for null detector windows, fixed byimplementing a more robust algorithm.

OM - MSSL - NCR - 95 Flat Field Acquisition nowsupported

OM - MSSL - NCR - 96 Scrubbing nowimplemented.

2.3 Modific ations between Release 5 and Release 6

T here were no software modification between release 5 and release 6 of this document. It was issued to clarifyand correct issue 5.

3

2.4 Modifications between Release 6 and Release 7

All software modules were changed because of the addition of extra comments as part of the process of detailed design documentation. In addition, the following NCRs and ECRs were closed.

ICU

Reference Comments

OM - MSSL - ECR - 75 Implement time - out to go to intermediate safe if tmbuffer fu ll after x min

OM - MSSL - NCR - 118 Incorrect sending of detector acquisition mode with IC_BPE_BINNING

OM - MSSL - NCR - 121 Active area offset not added to DP_WDW windowinfo

OM - MSSL - NCR - 122 Makefile modifications needed to ensure deliveryof .ads files

OM - MSSL - NCR - 127 Flat field will not work (part of ECR 72, NCR 118 is also related)

OM - MSSL - NCR - 128 15 Windows fromDP_WDW will not load

DPU

Reference Comments

OM - MSSL - NCR - 114 DPU reports clock synch errors

OM - MSSL - NCR - 115 DPU spontaneous reset following 30,1

OM - MSSL - NCR - 117 Bad command while uploading code

OM - MSSL - NCR - 119 ICU/DPU communication hang after 1 exposure

OM - MSSL - NCR - 120 DA_PROG_MERRORs after power cycle

OM - MSSL - NCR - 123 DPU heartbeat status does not reflect tracking on/off status

OM - MSSL - NCR - 126 DPU stops communicating at busyspot after 23 hours

OM - MSSL - NCR - 131 DP_WDW format correction.

4

2.8 Modifications between Release 7 and Release 8

ICU

Reference Comments

OM - MSSL - ECR - 72 Implement normal exposure with user selectable binning and tracking, see NCR127

OM - MSSL - ECR - 75 Implement auto - safing in the event of tmqueue staying full for > 5 mins.

OM - MSSL - ECR - 76 Package mutex needs an exception handler.

OM - MSSL - ECR - 81 Previouslyundocumented DPU alerts nowsupported.

OM - MSSL - ECR - 82 ICU issues 2 ` loss of filter wheel´ position messages.

OM - MSSL - NCR - 125 ICU crashes with status 0072 after 191 hours

OM - MSSL - NCR - 127 Support for lowresolution flat field.

OM - MSSL - NCR - 128 Support for 15 science windows.

OM - MSSL - NCR - 129 No telemetryfromOM after swi tch - on after OBDH problem - no s/wmod required.

OM - MSSL - NCR - 137 icu_mem_manager is missing a `return´ statement.

OM - MSSL - NCR - 140 Loss of telemetryassociated with filter wheel `hang´.

OM - MSSL - NCR - 144 Unnecessarytask in dpu_mem_manager causes failures .

OM - MSSL - NCR - 149 icu_mem_manager incorrectlycalls the `unguarded´ versions of icb_driver routines.

OM - MSSL - NCR - 151 ICB errors on start of operational mode.

OM - MSSL - NCR - 152 Fast HK SID could not be enabled.

OM - MSSL - NCR - 153 Fails to send expected ille gal parameters when setting invalid speeds of mechanisms.

OM - MSSL - NCR - 154 Fails to safe if f/wnot previouslydatumed.

OM - MSSL - NCR - 155 Always checks tc packet for valid crc, even when flag says it is not present.

OM - MSSL - NCR - 156 Zero movement of dichroi c is silentlyignored.

OM - MSSL - NCR - 157 Errors in makefile.

OM - MSSL - NCR - 158 Loss of HK whilst loading centroid look - up tables.

OM - MSSL - NCR - 165 Loss of `centroid table loaded´ message.

DPU

Reference Comments

OM - MSSL - ECR - 73 Colocate code in a single l ocation.

OM - MSSL - ECR - 74 Implement Robust DPU windowallocation for flat field data ˘ withdrawn..

OM - MSSL - ECR - 77 RT RD mode

OM - MSSL - ECR - 78 Implement enable/disable of scrubbing Global ProgramStorage.

OM - MSSL - ECR - 80 Extra alert A5B2

OM - MSSL - NCR - 94 ROM c ode crash ˘ no s/wchange required

OM - MSSL - NCR - 126 DPU stops communicating at busyspot after 23 hour run.

OM - MSSL - NCR - 130 Blue fast mode does not work.

OM - MSSL - NCR - 131 DP_WDW format correction.

OM - MSSL - NCR - 132 DPU crashes after power off/on using code s with red scrubbing.

OM - MSSL - NCR - 133 RED_FEC_ARRAY error reporting arrayallocation problem.

OM - MSSL - NCR - 134 Fast mode allocation error with same sampling time.

OM - MSSL - NCR - 135 Fast mode data area allocation wrong.

OM - MSSL - NCR - 136 RED DSP FEC s/wfail s to output cumulative count of single bit errors.

OM - MSSL - NCR - 146 Randomexception traced to uninitialised variable.

OM - MSSL - NCR - 160 A591 during `clean slate´ ˘ no code change required

5

2.6 . Modifications between Release 8 and Release 9B.

ICU

Refere nce Comments

OM - MSSL - NCR - 170 T ime synchronization mayfail occasionally ˘ 2us `settling´ required after time `freeze´

OM - MSSL - NCR - 172 Current drop for OM during SW loading.

OM - MSSL - NCR - 175 DPU memorydump (6,2) MID=0x20 to 0x27 produces bad Data :

OM - M SSL - NCR - 182 ICU - DPU protocol problemin the event of unexpected DPU reset. Code fixed and tested.

DPU

Reference Comments

OM - MSSL - NCR - 159 Fast mode crash

OM - MSSL - NCR - 166 Grismtracking. Modifications in place to prevent tracking whilst grismin use.

OM - MSSL - NCR - 171 Eng4 non - conformance to spec. Codes modified and tested.

OM - MSSL - NCR - 173 DPU output queue init error.

OM - MSSL - NCR - 179 Unable to performmultiple exposures after one single/common `choose guide stars´.

OM - MSSL - NCR - 180 Logic error in IC_D UMP_PROG_RAM command discovered. Codes modified and tested.

OM - MSSL - NCR - 181 Inconsistencyof DPU memorymap in flight and boot configuration.

6

2.7 Modifications between Release 9B and Release 10

ICU

Reference Comments

OM - MSSL - ECR - 086 Go to mode n if alreadyin mode n is rejected.

OM - MSSL - ECR - 087 Change all HV, filter and ADA exceptions to major anomalies.

OM - MSSL - ECR - 088 Auto - safe on filter wheel position loss

OM - MSSL - ECR - 089 Auto - safe on tmq full for 1 min rather than 5

OM - MSSL - NCR - 185 60h in of fset field of first science or engineering packet

OM - MSSL - NCR - 187 Incorrect DPU memorydump addresses

OM - MSSL - NCR - 188 No response to memorydump command

OM - MSSL - NCR - 191 Uninitialised variable in module timeman.adb .

OM - MSSL - NCR - 192 Instrument PSF broade r than expected (S/W auto control of focussing heaters).

OM - MSSL - NCR - 194 Go to Safe can fail if DPU sending out data

OM - MSSL - NCR - 195 Error code 134 `FW not datumed´ incorrectlysent as a Unsuccessful Command Acceptance

OM - MSSL - NCR - 196 HV Ramp - up failur e sent incorrect message when busy.

DPU

Reference Comments

OM - MSSL - NCR - 183 T racking not turned off if no good guide stars found

OM - MSSL - NCR - 189 DPU crashes due to higher than expected SEU rate.

OM - MSSL - NCR - 1 93 Incorrect reporting of memoryaccess .

OM - MSSL - NCR - 197 IC_CHOOSE_GS command not processed.

OM - MSSL - NCR - 198 Double bit error report takes too long.

7

2. 8 .Outstanding NCR´s and ECR´s.

Reference Comments

OM - MSSL - ECR - 077 RT RD. Will leave code in current state for this release ˘ not forma llyrequired.

OM - MSSL - ECR - 083 Distortion Maps not to be included for this release ˘ it appears to be a second order effect and mayeventuallybe omitted.

OM - MSSL - ECR - 085 RT RD requires newSID´s ˘ left open at ESA request.

OM - MSSL - NCR - 167 Magnifier track ing. Requires further thought due to extended requirements on local processor memory.

OM - MSSL - NCR - 184 Insufficient robustness in the guide star selection algorithm. T he guide star selection algorithm fails in the presence of a large number of extended so urces.

OM - MSSL - NCR - 186 Fast mode data contains internal inconsistencymanifested as more slices sampled than commanded in tracking frame

8

2.9 Operational Implications of Release 10

2.9.1 NCRs and ECRs to be closed.

T he i mplications of those NCRs and ECRs about to be closed are as follows.

OM - M SSL - ECR - 086 Go to mode n if already in mode n is rejected.

Consecutive similar mode changes are nowallowed which maybe used bythe ground procedures without causing an error.

OM - M SSL - ECR - 087 Change all HV, filter and ADA exceptions to major anomalies.

Appropriate databases should be modified ˘ see section 3.4 of XMM - OM/MSSL /ML/10 release 5 for details.

OM - M SSL - ECR - 088 Auto - safe on filter wheel position loss

T he ^ Loss of Filter Wheel Position~ message should be followed within 20 seconds by an ^ Automatic Safe

T ransition ~ or ^ Failed Automatic Safe T ransition ~ Major anomalymessage ˘ see section 3.4.3.1 of XMM -

OM/MSSL/ML/10 release 5 for details. An IC_INIT _DPU will also be sent to the DPU leading to the issuing of a

DA_EOT _INIT _DPU (A520) alert .

It will not be necessaryto performthe first step of the CRP "goto safe".

It will also no longer be possible to leave safe mode or to ramp up high voltages unless the filter wheel is in the blocked position ˘ see section 3.3.3 of XMM - OM/MSSL/ML/10 release 5 for the new ~ f/wnot at blocked ~ execution failure message.

OM - M SSL - ECR - 089 Auto - safe on tmq full for 1 min rather than 5

No procedural implications .

OM - M SSL - NCR - 183 Tracking not turned off if no good guide stars found

T here will no longer be hundreds of alerts produced with the magnifier. Anydisabled alerts such as GADE_RANGE errors should be re - enabled.

OM - M SSL - NCR - 185 60h in offset field of first science or engineering packet

T his bug will no longer be seen in the ground processing.

OM - M SSL - NCR - 187 Incorrect DPU memory dump addresses

No procedural implications

OM - M SSL - NCR - 188 No response to memory dump command

No procedural implications

OM - M SSL - NCR - 189 DPU crashes due to higher than expected SEU rate.

see ncr 198

OM - M SSL - NCR - 191 Uninitialised variable in module timeman.adb.

T his bug will not nowbe seen in the simulator.

OM - M SSL - NCR - 192 Instrument PSF broader than expected (S/W auto control of focussing heaters).

See note 10 in section 2.2.4.4.3.2. of XMM - OM/MSSL/ML/10 release 5 for details. In addition, it will be necessaryto allowfor thermal settling before and after magnifier observations as the heater settings for this filter are substantially different to the o thers. .

9

OM - M SSL - NCR - 193 Incorrect reporting of memory access.

No procedural implications

OM - M SSL - NCR - 194 Go to Safe can fail if DPU sending out data

Goto safe will impolitelytell the DPU to shut up (i.e. force suppression of all DPU data on the SSI ex cept heartbeats) and so should be used for contingencies only . Go to Safe will also send an IC_INIT _DPU to the DPU leading to the issuing of a DA_EOT _INIT _DPU (A520) alert. T he goto intermediate safe 70% sequence should be used at the end of an orbit.

OM - M SSL - NCR - 195 Error code 134 `FW not datumed´ incorrectly sent as a Unsuccessful Command

Acceptance

Appropriate databases mayneed to be modified ˘ see section 3.3.3 of XMM - OM/MSSL/ML/10 release 5 for details.

OM - M SSL - NCR - 196 HV Ramp - up failure sent inco rrect message when busy.

No implications.

OM - M SSL - NCR - 197 IC_CHOOSE_GS command not processed.

No implications.

OM - M SSL - NCR - 198 Double bit error report takes too long.

After ex e cuting clean slate procedure, it is necessaryto wait for at least 200 seco nds for anyscrubbing errors before continuing. Multi - bit errors will repeat on a timescale of more than 130 s nowrather than 16 s. See DPU scrubbing technical note (to be issued ) .

2.9.2 NCRs and ECRs remaining Open

Some open NCRs have the following ope rational implications

OM - M SSL - NCR - 167 M agnifier tracking

Look for memoryerrors and gade range errors (A5B2 and A5AD) during earlytesting.

OM - M SSL - NCR - 184 Insufficient robustness in the guide star selection algorithm. The guide star selection algorit hmfails in the presence of a large number of extended sources.

T racking maynot work for fields with manylarge extended sources.

OM - M SSL - NCR - 186 Fast mode data contains internal inconsistency manifested as more slices sampled than commanded in tracking frame

(phil will ring cheng to clarify)

10

2.9.3 Other Considerations

Timings

Because the dpu code has changed, times allowed for the completion of some dpu commands need to be retimed

( ic_ini t _exp, ic_init_dpu and ic_load_dpuos ).

Special compilation not e for DPU code

Before compiling the DPU code remember to edit the file dpu/development/include/sci_com.h and change the

#define for

STD_WAIT_STATE from1114 to 1116. T his makes the wait states 1116.

Uplink considerations

Onlyuplink the operational c ode (there cannot be a change to the ROM code of basic mode) . T his is to be found in file oper.hex.gx

T here are no changes to the `Magic Numbers´ as the ROM code cannot change.

DPU Technical note: exposure duration

Calculating the time it takes.

1 . sa a_time = ( 1 + 1 + dpu_x*dpu_y) *

[[sci_xsize/dpu_x]/saa_x] * [[sci_ysize/dpu_y]/saa_y]

Notice that [] means the smaller integer greater than the result.

2. zerotime = ( mmw_xsize * mmw_ysize)/zerosize . T his is the time we need to zero out the memorywindowto prepare for the next tracking frame.

Both numbers are in units of DPU msec = 1sec/1024. In Rel 10 and probably in 9b also

, saa_x=4, saa_y=40 , and zerosize=184 . So...

saa_time ~ 3 *176 *18 = 9504 DPU msec zerotime ~ 736 *736 / 184 = 29 44 DPU msec

T hese combined to 12 448 DPU "ms" = 12.15 s. Adding about 1 s for the drift calculation, we get 13.1 s for tracking/SAA/zeroing.

DPU Technical note: red scrubbing

.T here are 0xF6B DPU programcode blocks. Each Prog block consists of

15+1 wor ds. Assume it takes 4 DPU BUS cycle to scrub one block. In the case when red is not doing SAA or anything serious, this is consistent with the 15.x second number we sawseparating the A592 alerts in NCR 198.

T his has been changed now: when we are not doin g the SAA, the cycle time for scrubbing is about 130 s.

11

3. BASIC MODE ADA CODE

-------------------

CVS repository: MSSL

CVS module: icu/fm/basic

CVS tag: release7

File: Makefile Status: LocallyModified

Working revision: 1.9 T hu Mar 5 11: 54:19 1998

Repositoryrevision: 1.9 /home/egse/CVS/icu/fm/basic/Makefile,v

File: USERDEFS.asm Status: Up - to - date

Working revision: 1.3 Mon Mar 23 13:52:25 1998

Repositoryrevision: 1.3 /home/egse/CVS/icu/fm/basic/USERDEFS.asm,v

File: adamaked epend Status: Up - to - date

Working revision: 1.1 T hu Oct 16 14:36:12 1997

Repositoryrevision: 1.1 /home/egse/CVS/icu/fm/basic/adamakedepend,v

File: bcp4_ih.ads Status: Up - to - date

Working revision: 1.3 Sat Nov 22 17:22:41 1997

Repositor yrevision: 1.3 /home/egse/CVS/icu/fm/basic/bcp4_ih.ads,v

File: bcp4_ih.asm Status: Up - to - date

Working revision: 1.4 Wed Feb 11 17:14:23 1998

Repositoryrevision: 1.4 /home/egse/CVS/icu/fm/basic/bcp4_ih.asm,v

File: bsio.asm Status: Up - to - date

Working revision: 1.4 T ue Feb 10 13:32:13 1998

Repositoryrevision: 1.4 /home/egse/CVS/icu/fm/basic/bsio.asm,v

File: crc.adb Status: Up - to - date

Working revision: 1.3 Sat Nov 22 17:22:41 1997

Repositoryrevision: 1.3 /home/egse /CVS/icu/fm/basic/crc.adb,v

File: crc.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:41 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/crc.ads,v

File: debug.adb Status: Up - to - date

Working revision: 1.3 S at Nov 22 17:02:03 1997

Repositoryrevision: 1.3 /home/egse/CVS/icu/fm/basic/debug.adb,v

File: debug.ads Status: Up - to - date

Working revision: 1.8 Mon Mar 23 13:45:24 1998

Repositoryrevision: 1.8 /home/egse/CVS/icu/fm/basic/debug.ads,v

Fil e: dempsu.adb Status: Up - to - date

Working revision: 1.5 Mon Mar 23 13:45:24 1998

Repositoryrevision: 1.5 /home/egse/CVS/icu/fm/basic/dempsu.adb,v

File: dempsu.ads Status: Up - to - date

Working revision: 1.3 Sat Nov 22 17:22:42 1997

R epositoryrevision: 1.3 /home/egse/CVS/icu/fm/basic/dempsu.ads,v

File: emboot.asm Status: Up - to - date

Working revision: 1.21 Wed Apr 1 10:54:38 1998

Repositoryrevision: 1.21 /home/egse/CVS/icu/fm/basic/emboot.asm,v

File: emsubs.asm Sta tus: Up - to - date

Working revision: 1.6 Wed Apr 1 10:55:13 1998

Repositoryrevision: 1.6 /home/egse/CVS/icu/fm/basic/emsubs.asm,v

File: hk.adb Status: Up - to - date

Working revision: 1.24 Mon Mar 23 13:45:25 1998

Repositoryrevision: 1.2 4 /home/egse/CVS/icu/fm/basic/hk.adb,v

File: hk.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:43 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/hk.ads,v

File: icb.adb Status: Up - to - date

Working revis ion: 1.6 T hu Mar 5 12:34:30 1998

Repositoryrevision: 1.6 /home/egse/CVS/icu/fm/basic/icb.adb,v

File: icb.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:43 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/icb.ads ,v

File: icb_driver.adb Status: Up - to - date

Working revision: 1.13 T ue Mar 10 10:56:58 1998

12

Repositoryrevision: 1.13 /home/egse/CVS/icu/fm/basic/icb_driver.adb,v

File: icb_driver.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22: 44 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/icb_driver.ads,v

File: icu.ada Status: LocallyModified

Working revision: 1.11 T ue Mar 10 10:56:59 1998

Repositoryrevision: 1.11 /home/egse/CVS/icu/fm/basic/icu.ada,v

File: ic u_mem_manager.adb Status: Up - to - date

Working revision: 1.13 Mon Mar 9 12:46:08 1998

Repositoryrevision: 1.13 /home/egse/CVS/icu/fm/basic/icu_mem_manager.adb,v

File: icu_mem_manager.ads Status: Up - to - date

Working revision: 1.1 Sat Nov 22 16:45:51 1997

Repositoryrevision: 1.1 /home/egse/CVS/icu/fm/basic/icu_mem_manager.ads,v

File: importance.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:45 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/importance.ads,v

File: mem_manager.adb Status: Up - to - date

Working revision: 1.8 T hu Mar 5 12:34:31 1998

Repositoryrevision: 1.8 /home/egse/CVS/icu/fm/basic/mem_manager.adb,v

File: mem_manager.ads Status: Up - to - date

Working revision: 1.1 Sat Nov 22 16:46:10 1997

Repositoryrevision: 1.1 /home/egse/CVS/icu/fm/basic/mem_manager.ads,v

File: memloc.ads Status: Up - to - date

Working revision: 1.14 Wed Feb 11 17:14:24 1998

Repositoryrevision: 1.14 /home/egse/CVS/icu/fm/basic/memloc.ads,v

File: modeman.adb Status: Up - to - date

Working revision: 1.10 Mon Mar 23 13:45:25 1998

Repositoryrevision: 1.10 /home/egse/CVS/icu/fm/basic/modeman.adb,v

File: modeman.ads Status: Up - to - date

Working revision: 1.4 T hu Feb 12 15:42:04 1998

Repositoryrevi sion: 1.4 /home/egse/CVS/icu/fm/basic/modeman.ads,v

File: mutex.adb Status: Up - to - date

Working revision: 1.5 T hu Mar 5 12:34:31 1998

Repositoryrevision: 1.5 /home/egse/CVS/icu/fm/basic/mutex.adb,v

File: mutex.ads Status: Up - to - date

Working revision: 1.4 T ue Dec 2 12:54:39 1997

Repositoryrevision: 1.4 /home/egse/CVS/icu/fm/basic/mutex.ads,v

File: nhk.adb Status: Up - to - date

Working revision: 1.6 T hu Mar 5 12:34:31 1998

Repositoryrevision: 1.6 /home/egse/CVS/ic u/fm/basic/nhk.adb,v

File: nhk.ads Status: Up - to - date

Working revision: 1.3 T hu Mar 5 12:34:31 1998

Repositoryrevision: 1.3 /home/egse/CVS/icu/fm/basic/nhk.ads,v

File: packet.ads Status: Up - to - date

Working revision: 1.13 T hu Mar 5 11:56:42 1998

Repositoryrevision: 1.13 /home/egse/CVS/icu/fm/basic/packet.ads,v

File: peek_poke.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:48 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/peek_poke.ads,v

Fil e: peek_poke.asm Status: Up - to - date

Working revision: 1.1 T hu Oct 16 15:55:00 1997

Repositoryrevision: 1.1 /home/egse/CVS/icu/fm/basic/peek_poke.asm,v

File: rbi.adb Status: Up - to - date

Working revision: 1.11 T hu Mar 5 12:34:31 1998

Repositoryrevision: 1.11 /home/egse/CVS/icu/fm/basic/rbi.adb,v

File: rbi.ads Status: Up - to - date

Working revision: 1.5 T ue Dec 2 12:55:02 1997

Repositoryrevision: 1.5 /home/egse/CVS/icu/fm/basic/rbi.ads,v

File: rbi_ih.ads Status : Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:49 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/rbi_ih.ads,v

File: rbi_ih.asm Status: Up - to - date

Working revision: 1.4 Wed Feb 11 17:14:24 1998

13

Repositoryrevision: 1.4 /ho me/egse/CVS/icu/fm/basic/rbi_ih.asm,v

File: reset.ads Status: Up - to - date

Working revision: 1.3 T hu Feb 12 15:42:04 1998

Repositoryrevision: 1.3 /home/egse/CVS/icu/fm/basic/reset.ads,v

File: reset.asm Status: Up - to - date

Working rev ision: 1.5 Wed Apr 1 10:54:39 1998

Repositoryrevision: 1.5 /home/egse/CVS/icu/fm/basic/reset.asm,v

File: ssi_driver.adb Status: Up - to - date

Working revision: 1.4 T hu Mar 5 11:57:04 1998

Repositoryrevision: 1.4 /home/egse/CVS/icu/fm/basic/ssi _driver.adb,v

File: ssi_driver.ads Status: Up - to - date

Working revision: 1.3 T ue Nov 25 19:05:32 1997

Repositoryrevision: 1.3 /home/egse/CVS/icu/fm/basic/ssi_driver.ads,v

File: ssi_ih.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:50 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/ssi_ih.ads,v

File: ssi_ih.asm Status: Up - to - date

Working revision: 1.1 Fri Nov 21 22:04:17 1997

Repositoryrevision: 1.1 /home/egse/CVS/icu/fm/basic/ssi_ih.asm,v

File: ta sk_report.adb Status: Up - to - date

Working revision: 1.6 T hu Mar 5 12:34:32 1998

Repositoryrevision: 1.6 /home/egse/CVS/icu/fm/basic/task_report.adb,v

File: task_report.ads Status: Up - to - date

Working revision: 1.3 T hu Mar 5 12:34:32 1998

R epositoryrevision: 1.3 /home/egse/CVS/icu/fm/basic/task_report.ads,v

File: taskman.adb Status: Up - to - date

Working revision: 1.11 Mon Mar 23 13:45:25 1998

Repositoryrevision: 1.11 /home/egse/CVS/icu/fm/basic/taskman.adb,v

File: taskman.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:51 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/taskman.ads,v

File: tc_q.adb Status: Up - to - date

Working revision: 1.4 Sat Nov 22 17:22:51 1997

Repositoryrevisio n: 1.4 /home/egse/CVS/icu/fm/basic/tc_q.adb,v

File: tc_q.ads Status: Up - to - date

Working revision: 1.3 Sat Nov 22 17:22:52 1997

Repositoryrevision: 1.3 /home/egse/CVS/icu/fm/basic/tc_q.ads,v

File: tc_verify.adb Status: Up - to - date

Work ing revision: 1.5 T hu Mar 5 12:34:32 1998

Repositoryrevision: 1.5 /home/egse/CVS/icu/fm/basic/tc_verify.adb,v

File: tc_verify.ads Status: Up - to - date

Working revision: 1.3 T hu Mar 5 12:34:32 1998

Repositoryrevision: 1.3 /home/egse/CVS/icu/f m/basic/tc_verify.ads,v

File: tcq.adb Status: Up - to - date

Working revision: 1.8 T hu Mar 5 12:34:32 1998

Repositoryrevision: 1.8 /home/egse/CVS/icu/fm/basic/tcq.adb,v

File: tcq.ads Status: Up - to - date

Working revision: 1.2 Sat N ov 22 17:22:53 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/tcq.ads,v

File: time_man.adb Status: Up - to - date

Working revision: 1.11 T hu Mar 5 12:34:32 1998

Repositoryrevision: 1.11 /home/egse/CVS/icu/fm/basic/time_man.adb,v

File : time_man.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:54 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/time_man.ads,v

File: tlink17.lcf Status: Up - to - date

Working revision: 1.6 T hu Feb 12 15:42:04 1998

Repositoryrevision: 1.6 /home/egse/CVS/icu/fm/basic/tlink17.lcf,v

File: tm_man.adb Status: Up - to - date

Working revision: 1.14 Mon Mar 23 13:45:25 1998

Repositoryrevision: 1.14 /home/egse/CVS/icu/fm/basic/tm_man.adb,v

File: tm_man.ads S tatus: Up - to - date

Working revision: 1.3 Sat Nov 22 17:22:54 1997

14

Repositoryrevision: 1.3 /home/egse/CVS/icu/fm/basic/tm_man.ads,v

File: tm_q.adb Status: Up - to - date

Working revision: 1.4 Sat Nov 22 17:22:55 1997

Repositoryrevision: 1. 4 /home/egse/CVS/icu/fm/basic/tm_q.adb,v

File: tm_q.ads Status: Up - to - date

Working revision: 1.3 Sat Nov 22 17:22:55 1997

Repositoryrevision: 1.3 /home/egse/CVS/icu/fm/basic/tm_q.ads,v

File: tmpsu.adb Status: Up - to - date

Working r evision: 1.6 Wed Feb 11 17:50:51 1998

Repositoryrevision: 1.6 /home/egse/CVS/icu/fm/basic/tmpsu.adb,v

File: tmpsu.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:56 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/t mpsu.ads,v

File: tmq.adb Status: Up - to - date

Working revision: 1.8 T hu Mar 5 12:34:33 1998

Repositoryrevision: 1.8 /home/egse/CVS/icu/fm/basic/tmq.adb,v

File: tmq.ads Status: Up - to - date

Working revision: 1.4 T hu Mar 5 12:34:3 3 1998

Repositoryrevision: 1.4 /home/egse/CVS/icu/fm/basic/tmq.ads,v

File: types.ads Status: Up - to - date

Working revision: 1.2 Sat Nov 22 17:22:56 1997

Repositoryrevision: 1.2 /home/egse/CVS/icu/fm/basic/types.ads,v

15

4. OPERATIONAL MO DE ADA CODE

-------------------------

CVS repository: MSSL

CVS module: icu/fm/oper

File: INTVEC.asm Status: Up - to - date

Working revision: 1.2 Thu Nov 18 12:12:13 1999

Repository revision: 1.2 /home/egse/CVS/icu/fm/oper/INTVEC. asm,v

File: Makefile Status: Up - to - date

Working revision: 1.20 Tue Feb 8 09:26:20 2000

Repository revision: 1.20 /home/egse/CVS/icu/fm/oper/Makefile,v

File: USERDEFS.asm Status: Up - to - date

Working revision: 1.4 Thu Nov 18 12:12:13 1 999

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/USERDEFS.asm,v

File: adamakecleanup Status: Up - to - date

Working revision: 1.5 Thu Apr 23 09:01:28 1998

Repository revision: 1.5 /home/egse/CVS/icu/fm/oper/adamakecleanup,v

File: adamakedepe nd Status: Up - to - date

Working revision: 1.3 Wed Feb 24 14:52:43 1999

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/adamakedepend,v

File: bcp4_ih.ads Status: Up - to - date

Working revision: 1.3 Fri Oct 30 17:27:11 1998

Repository re vision: 1.3 /home/egse/CVS/icu/fm/oper/bcp4_ih.ads,v

File: bcp4_ih.asm Status: Up - to - date

Working revision: 1.7 Thu Nov 18 12:12:14 1999

Repository revision: 1.7 /home/egse/CVS/icu/fm/oper/bcp4_ih.asm,v

File: crc.adb Status: Up - to - dat e

Working revision: 1.4 Thu Nov 18 12:12:14 1999

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/crc.adb,v

File: crc.ads Status: Up - to - date

Working revision: 1.3 Thu Nov 18 12:12:14 1999

Repository revision: 1.3 /home/egse/CVS/icu /fm/oper/crc.ads,v

File: debug.adb Status: Up - to - date

Working revision: 1.8 Thu Nov 18 12:12:15 1999

Repository revision: 1.8 /home/egse/CVS/icu/fm/oper/debug.adb,v

File: debug.ads Status: Up - to - date

Working revision: 1.14 Thu Nov 18 12:12:15 1999

Repository revision: 1.14 /home/egse/CVS/icu/fm/oper/debug.ads,v

File: dempsu.adb Status: Up - to - date

Working revision: 1.5 Mon Oct 26 14:13:39 1998

Repository revision: 1.5 /home/egse/CVS/icu/fm/oper/dempsu.adb,v

File: demp su.ads Status: Up - to - date

Working revision: 1.4 Thu Nov 18 12:12:15 1999

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/dempsu.ads,v

File: detanalog.adb Status: Up - to - date

Working revision: 1.27 Tue Apr 18 12:05:35 2000

Reposito ry revision: 1.27 /home/egse/CVS/icu/fm/oper/detanalog.adb,v

File: detanalog.ads Status: Up - to - date

Working revision: 1.9 Thu Nov 18 12:12:17 1999

Repository revision: 1.9 /home/egse/CVS/icu/fm/oper/detanalog.ads,v

File: detdigital.adb Status: Up - to - date

Working revision: 1.23 Fri Apr 7 10:54:26 2000

Repository revision: 1.23 /home/egse/CVS/icu/fm/oper/detdigital.adb,v

File: detdigital.ads Status: Up - to - date

Working revision: 1.4 Mon Oct 26 14:13:40 1998

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/detdigital.ads,v

File: detector.ads Status: Up - to - date

Working revision: 1.9 Mon Oct 26 14:13:40 1998

Repository revision: 1.9 /home/egse/CVS/icu/fm/oper/detector.ads,v

File: dpu.adb Status: Up - to - date

Wo rking revision: 1.36 Fri Apr 7 10:56:23 2000

Repository revision: 1.36 /home/egse/CVS/icu/fm/oper/dpu.adb,v

File: dpu.ads Status: Up - to - date

Working revision: 1.12 Mon Mar 27 14:11:03 2000

Repository revision: 1.12 /home/egse/CVS/icu/fm /oper/dpu.ads,v

File: dpu_mem_manager.adb Status: Up - to - date

Working revision: 1.22 Fri Apr 7 10:57:14 2000

Repository revision: 1.22 /home/egse/CVS/icu/fm/oper/dpu_mem_manager.adb,v

16

File: dpu_mem_manager.ads Status: Up - to - date

Working revision: 1.4 Fri Oct 30 17:27:12 1998

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/dpu_mem_manager.ads,v

File: dpu_mnemo.ads Status: Up - to - date

Working revision: 1.8 Thu Feb 25 10:08:09 1999

Repository revision: 1.8 /home/egse/CVS/icu/fm/oper/dp u_mnemo.ads,v

File: heater.adb Status: Up - to - date

Working revision: 1.14 Tue Apr 18 12:06:56 2000

Repository revision: 1.14 /home/egse/CVS/icu/fm/oper/heater.adb,v

File: heater.ads Status: Up - to - date

Working revision: 1.3 Mon Oct 26 14:13:42 1998

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/heater.ads,v

File: hk.adb Status: Up - to - date

Working revision: 1.25 Fri Apr 7 11:02:05 2000

Repository revision: 1.25 /home/egse/CVS/icu/fm/oper/hk.adb,v

File: hk.ads Status: Up - to - date

Working revision: 1.5 Thu Nov 18 12:12:19 1999

Repository revision: 1.5 /home/egse/CVS/icu/fm/oper/hk.ads,v

File: icb.adb Status: Up - to - date

Working revision: 1.13 Thu Nov 18 12:12:19 1999

Repository revisi on: 1.13 /home/egse/CVS/icu/fm/oper/icb.adb,v

File: icb.ads Status: Up - to - date

Working revision: 1.7 Thu Nov 18 12:12:20 1999

Repository revision: 1.7 /home/egse/CVS/icu/fm/oper/icb.ads,v

File: icb_driver.adb Status: Up - to - date

Workin g revision: 1.10 Thu Nov 18 12:12:20 1999

Repository revision: 1.10 /home/egse/CVS/icu/fm/oper/icb_driver.adb,v

File: icb_driver.ads Status: Up - to - date

Working revision: 1.4 Thu Nov 18 12:12:20 1999

Repository revision: 1.4 /home/egse/CVS/icu/f m/oper/icb_driver.ads,v

File: icu.ada Status: Up - to - date

Working revision: 1.15 Fri Apr 7 11:02:34 2000

Repository revision: 1.15 /home/egse/CVS/icu/fm/oper/icu.ada,v

File: icu_mem_manager.adb Status: Up - to - date

Working revision: 1.15 F ri Apr 7 11:03:18 2000

Repository revision: 1.15 /home/egse/CVS/icu/fm/oper/icu_mem_manager.adb,v

File: icu_mem_manager.ads Status: Up - to - date

Working revision: 1.3 Fri Oct 30 17:27:12 1998

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/icu_ mem_manager.ads,v

File: importance.ads Status: Up - to - date

Working revision: 1.8 Mon Mar 8 16:21:06 1999

Repository revision: 1.8 /home/egse/CVS/icu/fm/oper/importance.ads,v

File: mechanism.adb Status: Up - to - date

Working revision: 1.27 Tue Apr 18 12:09:00 2000

Repository revision: 1.27 /home/egse/CVS/icu/fm/oper/mechanism.adb,v

File: mechanism.ads Status: Up - to - date

Working revision: 1.9 Thu Nov 18 12:12:22 1999

Repository revision: 1.9 /home/egse/CVS/icu/fm/oper/mechanism.ads,v

File: mem_manager.adb Status: Up - to - date

Working revision: 1.10 Fri Apr 7 11:06:17 2000

Repository revision: 1.10 /home/egse/CVS/icu/fm/oper/mem_manager.adb,v

File: mem_manager.ads Status: Up - to - date

Working revision: 1.3 Fri Oct 30 17:27:12 1998

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/mem_manager.ads,v

File: memdpu.adb Status: Up - to - date

Working revision: 1.12 Mon Mar 27 14:14:52 2000

Repository revision: 1.12 /home/egse/CVS/icu/fm/oper/memdpu.adb,v

File: memdpu.a ds Status: Up - to - date

Working revision: 1.2 Mon Oct 26 14:13:46 1998

Repository revision: 1.2 /home/egse/CVS/icu/fm/oper/memdpu.ads,v

File: memloc.ads Status: Up - to - date

Working revision: 1.16 Tue Apr 18 12:10:04 2000

Repository r evision: 1.16 /home/egse/CVS/icu/fm/oper/memloc.ads,v

File: modeman.adb Status: Up - to - date

Working revision: 1.13 Thu May 11 15:49:37 2000

Repository revision: 1.13 /home/egse/CVS/icu/fm/oper/modeman.adb,v File:

modeman.ads Status : Up - to - date

Working revision: 1.7 Thu Nov 18 12:12:23 1999

Repository revision: 1.7 /home/egse/CVS/icu/fm/oper/modeman.ads,v

File: mutex.adb Status: Up - to - date

17

Working revision: 1.13 Fri Apr 7 11:06:43 2000

Repository revision: 1.13 / home/egse/CVS/icu/fm/oper/mutex.adb,v

File: mutex.ads Status: Up - to - date

Working revision: 1.5 Mon Oct 26 14:13:46 1998

Repository revision: 1.5 /home/egse/CVS/icu/fm/oper/mutex.ads,v

File: nhk.adb Status: Up - to - date

Working revi sion: 1.8 Thu Nov 18 12:12:23 1999

Repository revision: 1.8 /home/egse/CVS/icu/fm/oper/nhk.adb,v

File: nhk.ads Status: Up - to - date

Working revision: 1.3 Mon Oct 26 14:13:47 1998

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/nhk.ads, v

File: packet.ads Status: Up - to - date

Working revision: 1.22 Tue Apr 18 12:12:45 2000

Repository revision: 1.22 /home/egse/CVS/icu/fm/oper/packet.ads,v

File: peek_poke.ads Status: Up - to - date

Working revision: 1.2 Mon Oct 26 13:55:34 199 8

Repository revision: 1.2 /home/egse/CVS/icu/fm/oper/peek_poke.ads,v

File: peek_poke.asm Status: Up - to - date

Working revision: 1.3 Thu Nov 18 12:12:24 1999

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/peek_poke.asm,v

File: rbi.adb Status: Up - to - date

Working revision: 1.16 Fri Apr 7 11:08:23 2000

Repository revision: 1.16 /home/egse/CVS/icu/fm/oper/rbi.adb,v

File: rbi.ads Status: Up - to - date

Working revision: 1.5 Thu Nov 18 12:12:24 1999

Repository revision : 1.5 /home/egse/CVS/icu/fm/oper/rbi.ads,v

File: rbi_ih.ads Status: Up - to - date

Working revision: 1.1 Mon Mar 23 17:19:27 1998

Repository revision: 1.1 /home/egse/CVS/icu/fm/oper/rbi_ih.ads,v

File: rbi_ih.asm Status: Up - to - date

Workin g revision: 1.6 Fri Oct 30 17:27:12 1998

Repository revision: 1.6 /home/egse/CVS/icu/fm/oper/rbi_ih.asm,v

File: reset.ads Status: Up - to - date

Working revision: 1.2 Mon Oct 26 13:55:35 1998

Repository revision: 1.2 /home/egse/CVS/icu/fm/oper /reset.ads,v

File: reset.asm Status: Up - to - date

Working revision: 1.3 Thu Nov 18 12:12:25 1999

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/reset.asm,v

File: safing.adb Status: Up - to - date

Working revision: 1.6 Fri Apr 7 11:0 8:56 2000

Repository revision: 1.6 /home/egse/CVS/icu/fm/oper/safing.adb,v

File: safing.ads Status: Up - to - date

Working revision: 1.4 Thu Nov 18 12:12:25 1999

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/safing.ads,v

File: science_fm. adb Status: Up - to - date

Working revision: 1.4 Tue Feb 15 12:15:50 2000

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/science_fm.adb,v

File: science_fm.ads Status: Up - to - date

Working revision: 1.3 Thu Nov 18 12:12:26 1999

Repository r evision: 1.3 /home/egse/CVS/icu/fm/oper/science_fm.ads,v

File: ssi_driver.adb Status: Up - to - date

Working revision: 1.19 Fri Apr 7 11:09:25 2000

Repository revision: 1.19 /home/egse/CVS/icu/fm/oper/ssi_driver.adb,v

File: ssi_driver.ads Status: Up - to - date

Working revision: 1.4 Mon Oct 26 13:55:35 1998

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/ssi_driver.ads,v

File: ssi_ih.ads Status: Up - to - date

Working revision: 1.1 Mon Mar 23 17:19:27 1998

Repository revision: 1.1 /h ome/egse/CVS/icu/fm/oper/ssi_ih.ads,v

File: ssi_ih.asm Status: Up - to - date

Working revision: 1.3 Mon Nov 24 15:12:57 1997

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/ssi_ih.asm,v

File: ssi_in.adb Status: Up - to - date

Working rev ision: 1.12 Fri Apr 7 11:10:11 2000

Repository revision: 1.12 /home/egse/CVS/icu/fm/oper/ssi_in.adb,v

File: ssi_in.ads Status: Up - to - date

Working revision: 1.3 Thu Nov 18 12:12:27 1999

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/ss i_in.ads,v

File: ssi_out.adb Status: Up - to - date

Working revision: 1.12 Fri Apr 7 11:10:41 2000

18

Repository revision: 1.12 /home/egse/CVS/icu/fm/oper/ssi_out.adb,v

File: ssi_out.ads Status: Up - to - date

Working revision: 1.3 Thu Nov 18 12 :12:27 1999

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/ssi_out.ads,v

File: task_report.adb Status: Up - to - date

Working revision: 1.10 Fri Apr 7 11:11:11 2000

Repository revision: 1.10 /home/egse/CVS/icu/fm/oper/task_report.adb,v

File: t ask_report.ads Status: Up - to - date

Working revision: 1.4 Mon Oct 26 14:13:50 1998

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/task_report.ads,v

File: taskman.adb Status: Up - to - date

Working revision: 1.25 Fri Apr 7 11:11:37 2000

Repository revision: 1.25 /home/egse/CVS/icu/fm/oper/taskman.adb,v

File: taskman.ads Status: Up - to - date

Working revision: 1.2 Mon Oct 26 14:13:51 1998

Repository revision: 1.2 /home/egse/CVS/icu/fm/oper/taskman.ads,v

File: tc_q.adb Sta tus: Up - to - date

Working revision: 1.7 Thu Nov 18 12:12:28 1999

Repository revision: 1.7 /home/egse/CVS/icu/fm/oper/tc_q.adb,v

File: tc_q.ads Status: Up - to - date

Working revision: 1.7 Thu Nov 18 12:12:29 1999

Repository revision: 1.7 /ho me/egse/CVS/icu/fm/oper/tc_q.ads,v

File: tc_verify.adb Status: Up - to - date

Working revision: 1.10 Mon Mar 27 14:19:22 2000

Repository revision: 1.10 /home/egse/CVS/icu/fm/oper/tc_verify.adb,v

File: tc_verify.ads Status: Up - to - date

Working r evision: 1.5 Thu Nov 18 12:12:29 1999

Repository revision: 1.5 /home/egse/CVS/icu/fm/oper/tc_verify.ads,v

File: tcq.adb Status: Up - to - date

Working revision: 1.10 Thu Nov 18 12:12:30 1999

Repository revision: 1.10 /home/egse/CVS/icu/fm/op er/tcq.adb,v

File: tcq.ads Status: Up - to - date

Working revision: 1.2 Mon Oct 26 14:13:52 1998

Repository revision: 1.2 /home/egse/CVS/icu/fm/oper/tcq.ads,v

File: time_man.adb Status: Up - to - date

Working revision: 1.19 Fri Apr 7 11:12 :20 2000

Repository revision: 1.19 /home/egse/CVS/icu/fm/oper/time_man.adb,v

File: time_man.ads Status: Up - to - date

Working revision: 1.4 Mon Oct 26 14:13:53 1998

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/time_man.ads,v

File: timer_a _ih.adb Status: Up - to - date

Working revision: 1.3 Thu Nov 18 12:12:30 1999

Repository revision: 1.3 /home/egse/CVS/icu/fm/oper/timer_a_ih.adb,v

File: timer_a_ih.ads Status: Up - to - date

Working revision: 1.3 Thu Nov 18 12:12:31 1999

Reposito ry revision: 1.3 /home/egse/CVS/icu/fm/oper/timer_a_ih.ads,v

File: tlink17.lcf Status: Up - to - date

Working revision: 1.8 Wed Feb 24 14:59:04 1999

Repository revision: 1.8 /home/egse/CVS/icu/fm/oper/tlink17.lcf,v

File: tm_man.adb Status: U p - to - date

Working revision: 1.16 Fri Apr 7 11:13:10 2000

Repository revision: 1.16 /home/egse/CVS/icu/fm/oper/tm_man.adb,v

File: tm_man.ads Status: Up - to - date

Working revision: 1.5 Thu Nov 18 12:12:32 1999

Repository revision: 1.5 /home /egse/CVS/icu/fm/oper/tm_man.ads,v

File: tm_q.adb Status: Up - to - date

Working revision: 1.12 Fri Apr 7 11:13:55 2000

Repository revision: 1.12 /home/egse/CVS/icu/fm/oper/tm_q.adb,v

File: tm_q.ads Status: Up - to - date

Working revisi on: 1.4 Mon Oct 26 14:13:54 1998

Repository revision: 1.4 /home/egse/CVS/icu/fm/oper/tm_q.ads,v

File: tmpsu.adb Status: Up - to - date

Working revision: 1.14 Fri Apr 7 11:14:25 2000

Repository revision: 1.14 /home/egse/CVS/icu/fm/oper/tmpsu.a db,v

File: tmpsu.ads Status: Up - to - date

Working revision: 1.5 Thu Nov 18 12:12:33 1999

Repository revision: 1.5 /home/egse/CVS/icu/fm/oper/tmpsu.ads,v

File: tmq.adb Status: Up - to - date

Working revision: 1.16 Fri Apr 7 11:15:31 20 00

Repository revision: 1.16 /home/egse/CVS/icu/fm/oper/tmq.adb,v

19

File: tmq.ads Status: Up - to - date

Working revision: 1.7 Wed Dec 16 11:15:11 1998

Repository revision: 1.7 /home/egse/CVS/icu/fm/oper/tmq.ads,v

File: types.ads Statu s: Up - to - date

Working revision: 1.2 Mon Oct 26 14:13:55 1998

Repository revision: 1.2 /home/egse/CVS/icu/fm/oper/types.ads,v

20

5. DPU CODE

--------

CVS repository: UCSB

CVS modules: white, blue, red, include, dpu/util

CVS tag: release 10

White CVS M odule

File: README Status: Up - to - date

Working revision: 1.1 Mon Mar 6 18:54:59 1995

Repository revision: 1.1 /home/xmmom/cvs/master/white/README,v

File: white.asm Status: Up - to - date

Working revision: 1.29 Sat Aug 21 06:09:59 1999

Repository revision: 1.29 /home/xmmom/cvs/master/white/src/asm/white.asm,v

File: cwhite.c Status: Up - to - date

Working revision: 1.48 Fri May 12 07:36:40 2000

Repository revision: 1.48 /home/xmmom/cvs/master/white/src/cc/cwhite.c,v

Fi le: shared_io_functions.c Status: Up - to - date

Working revision: 1.26 Fri May 12 07:36:40 2000

Repository revision: 1.26

/home/xmmom/cvs/master/white/src/cc/shared_io_functions.c,v

File: shared_variables.c Status: Up - to - date

Working revision: 1.22 F ri May 12 07:36:40 2000

Repository revision: 1.22

/home/xmmom/cvs/master/white/src/cc/shared_variables.c,v

File: su_calbgd.c Status: Up - to - date

Working revision: 1.25 Thu Feb 25 05:08:10 1999

Repository revision: 1.25

/home/xmmom/cvs/master/ white/src/cc/su_calbgd.c,v

File: su_caldrft.c Status: Up - to - date

Working revision: 1.25 Wed Feb 10 21:54:18 1999

Repository revision: 1.25

/home/xmmom/cvs/master/white/src/cc/su_caldrft.c,v

File: su_compress.c Status: Up - to - date

Working r evision: 1.12 Fri May 12 07:36:41 2000

Repository revision: 1.12

/home/xmmom/cvs/master/white/src/cc/su_compress.c,v

File: su_deliverdata.c Status: Up - to - date

Working revision: 1.42 Fri May 12 07:36:41 2000

Repository revision: 1.42

/home/xmmom/c vs/master/white/src/cc/su_deliverdata.c,v

File: su_dowindow.c Status: Up - to - date

Working revision: 1.33 Sat Aug 21 05:40:15 1999

Repository revision: 1.33

/home/xmmom/cvs/master/white/src/cc/su_dowindow.c,v

File: su_dpuabort.c Status: Up - to - d ate

Working revision: 1.10 Sat Aug 3 13:47:46 1996

Repository revision: 1.10

/home/xmmom/cvs/master/white/src/cc/su_dpuabort.c,v

File: su_engineering.c Status: Up - to - date

Working revision: 1.11 Thu Jan 21 08:13:13 1999

Repository revision: 1. 11

/home/xmmom/cvs/master/white/src/cc/su_engineering.c,v

File: su_getref.c Status: Up - to - date

Working revision: 1.21 Thu Feb 25 05:08:09 1999

Repository revision: 1.21

/home/xmmom/cvs/master/white/src/cc/su_getref.c,v

File: su_init_exp.c S tatus: Up - to - date

Working revision: 1.10 Thu Nov 12 07:03:14 1998

Repository revision: 1.10

/home/xmmom/cvs/master/white/src/cc/su_init_exp.c,v

File: su_initialize.c Status: Up - to - date

Working revision: 1.41 Fri May 12 07:36:42 2000

Repositor y revision: 1.41

/home/xmmom/cvs/master/white/src/cc/su_initialize.c,v

File: su_locategs.c Status: Up - to - date

Working revision: 1.26 Fri May 12 07:36:42 2000

21

Repository revision: 1.26

/home/xmmom/cvs/master/white/src/cc/su_locategs.c,v

File: su_m akeags_id.c Status: Up - to - date

Working revision: 1.17 Tue Sep 9 15:19:41 1997

Repository revision: 1.17

/home/xmmom/cvs/master/white/src/cc/su_makeags_id.c,v

File: su_restore_stars.c Status: Up - to - date

Working revision: 1.23 Thu Feb 25 05:08:11 1999

Repository revision: 1.23

/home/xmmom/cvs/master/white/src/cc/su_restore_stars.c,v

File: su_rtrd.c Status: Up - to - date

Working revision: 1.5 Sat Aug 21 05:56:39 1999

Repository revision: 1.5 /home/xmmom/cvs/master/white/src/cc/su_rtrd .c,v

File: su_scanbs.c Status: Up - to - date

Working revision: 1.29 Thu Jan 21 08:13:11 1999

Repository revision: 1.29

/home/xmmom/cvs/master/white/src/cc/su_scanbs.c,v

File: su_scangs.c Status: Up - to - date

Working revision: 1.28 Fri May 1 2 07:36:43 2000

Repository revision: 1.28

/home/xmmom/cvs/master/white/src/cc/su_scangs.c,v

File: su_submit_cmprss_q.c Status: Up - to - date

Working revision: 1.4 Thu May 28 04:41:50 1998

Repository revision: 1.4

/home/xmmom/cvs/master/white/src/cc/s u_submit_cmprss_q.c,v

File: sun_util.c Status: Up - to - date

Working revision: 1.28 Thu Feb 25 06:08:16 1999

Repository revision: 1.28 /home/xmmom/cvs/master/white/src/cc/sun_util.c,v

File: whitedsp.c Status: Up - to - date

Working revision : 1.70 Fri May 12 07:36:44 2000

Repository revision: 1.70 /home/xmmom/cvs/master/white/src/cc/whitedsp.c,v

File: white_crt056y.asm Status: Up - to - date

Working revision: 1.1 Mon Dec 5 19:43:41 1994

Repository revision: 1.1

/home/xmmom/cvs/master/wh ite/src/crt/white_crt056y.asm,v

Blue CVS M odule

File: blue.asm Status: Up - to - date

Working revision: 1.35 Fri May 12 07:36:46 2000

Repository revision: 1.35 /home/xmmom/cvs/master/blue/src/blue.asm,v

Red CVS Module

File: red.asm Status: Up - to - date

Working revision: 1.18 Fri Feb 19 20:29:16 1999

Repository revision: 1.18 /home/xmmom/cvs/master/red/src/asm/red.asm,v

File: README Status: Up - to - date

Working revision: 1.2 Mon Mar 6 18:55:44 1995

Repository revi sion: 1.2 /home/xmmom/cvs/master/red/src/cc/README,v

File: cred.c Status: Up - to - date

Working revision: 1.11 Fri Feb 19 06:00:14 1999

Repository revision: 1.11 /home/xmmom/cvs/master/red/src/cc/cred.c,v

File: reddsp.c Status: Up - to - date

Working revision: 1.27 Fri May 12 07:36:37 2000

Repository revision: 1.27 /home/xmmom/cvs/master/red/src/cc/reddsp.c,v

File: sun_hopper.c Status: Up - to - date

Working revision: 1.2 Thu Jan 11 21:06:35 1996

Repository revision: 1.2 /hom e/xmmom/cvs/master/red/src/cc/sun_hopper.c,v

File: red_crt056y.asm Status: Up - to - date

Working revision: 1.2 Mon Dec 5 20:08:37 1994

Repository revision: 1.2

/home/xmmom/cvs/master/red/src/crt/red_crt056y.asm,v

Include CVS M odule

File: FecCode.as m Status: Up - to - date

Working revision: 1.6 Wed Sep 23 22:21:04 1998

Repository revision: 1.6 /home/xmmom/cvs/master/include/FecCode.asm,v

File: FecTab.asm Status: Up - to - date

22

Working revision: 1.2 Fri Sep 11 16:46:07 1998

Repository revision: 1.2 /home/xmmom/cvs/master/include/FecTab.asm,v

File: README Status: Up - to - date

Working revision: 1.1.1.1 Mon Dec 5 15:16:28 1994

Repository revision: 1.1.1.1 /home/xmmom/cvs/master/include/README,v

File: Readme.ps Stat us: Up - to - date

Working revision: 1.2 Wed Sep 13 20:12:16 1995

Repository revision: 1.2 /home/xmmom/cvs/master/include/Readme.ps,v

File: cred.h Status: Up - to - date

Working revision: 1.7 Mon Feb 8 03:45:50 1999

Repository revision: 1.7 /home/xmmom/cvs/master/include/cred.h,v

File: cwhite.h Status: Up - to - date

Working revision: 1.10 Wed Dec 9 22:07:45 1998

Repository revision: 1.10 /home/xmmom/cvs/master/include/cwhite.h,v

File: dpu_util.h Status: Up - to - date

Work ing revision: 1.8 Thu Jun 13 17:11:31 1996

Repository revision: 1.8 /home/xmmom/cvs/master/include/dpu_util.h,v

File: dpucfg_map.h Status: Up - to - date

Working revision: 1.14 Fri May 12 07:36:47 2000

Repository revision: 1.14 /home/xmmom/cvs/ma ster/include/dpucfg_map.h,v

File: global_access.c Status: Up - to - date

Working revision: 1.16 Fri May 12 07:36:48 2000

Repository revision: 1.16 /home/xmmom/cvs/master/include/global_access.c,v

File: hopper.asm Status: Up - to - date

Working re vision: 1.2 Wed Dec 9 22:11:35 1998

Repository revision: 1.2 /home/xmmom/cvs/master/include/hopper.asm,v

File: idiot.h Status: Up - to - date

Working revision: 1.21 Thu Feb 25 05:21:14 1999

Repository revision: 1.21 /home/xmmom/cvs/master/i nclude/idiot.h,v

File: macro.h Status: Up - to - date

Working revision: 1.4 Thu Jan 11 23:42:08 1996

Repository revision: 1.4 /home/xmmom/cvs/master/include/macro.h,v

File: mic_restore_0.h Status: Up - to - date

Working revision: 1.1 Sat Aug 2 1 06:49:44 1999

Repository revision: 1.1 /home/xmmom/cvs/master/include/mic_restore_0.h,v

File: mic_restore_1.h Status: Up - to - date

Working revision: 1.1 Sat Aug 21 06:49:45 1999

Repository revision: 1.1 /home/xmmom/cvs/master/include/mic_restore _1.h,v

File: mic_restore_old.h Status: Up - to - date

Working revision: 1.1 Sat Aug 21 06:49:45 1999

Repository revision: 1.1

/home/xmmom/cvs/master/include/mic_restore_old.h,v

File: mic_restore_params.h Status: Up - to - date

Working revision: 1.5 Sat Au g 21 06:49:46 1999

Repository revision: 1.5

/home/xmmom/cvs/master/include/mic_restore_params.h,v

File: nop.asm Status: Up - to - date

Working revision: 1.1 Thu May 28 17:05:21 1998

Repository revision: 1.1 /home/xmmom/cvs/master/include/nop .asm,v

File: our_own_types.h Status: Up - to - date

Working revision: 1.9 Sat Aug 3 13:55:08 1996

Repository revision: 1.9 /home/xmmom/cvs/master/include/our_own_types.h,v

File: red.h Status: Up - to - date

Working revision: 1.6 Wed Sep 23 22:21:07 1998

Repository revision: 1.6 /home/xmmom/cvs/master/include/red.h,v

File: red_buffers.h Status: Up - to - date

Working revision: 1.2 Fri Feb 17 17:11:39 1995

Repository revision: 1.2 /home/xmmom/cvs/master/include/red_buffers.h,v

File: r ed_control.h Status: Up - to - date

Working revision: 1.6 Tue Sep 9 15:23:04 1997

Repository revision: 1.6 /home/xmmom/cvs/master/include/red_control.h,v

File: red_crt0_equ.h Status: Up - to - date

Working revision: 1.2 Fri Feb 17 17:11:42 1995

Repository revision: 1.2 /home/xmmom/cvs/master/include/red_crt0_equ.h,v

File: red_default.h Status: Up - to - date

Working revision: 1.16 Mon Sep 20 05:22:58 1999

Repository revision: 1.16 /home/xmmom/cvs/master/include/red_default.h,v

File: red_os _variables.h Status: Up - to - date

Working revision: 1.6 Sat Sep 19 10:01:06 1998

23

Repository revision: 1.6

/home/xmmom/cvs/master/include/red_os_variables.h,v

File: red_shared_variables.h Status: Up - to - date

Working revision: 1.10 Fri May 12 07:36:49 2000

Repository revision: 1.10

/home/xmmom/cvs/master/include/red_shared_variables.h,v

File: red_static_variables.h Status: Up - to - date

Working revision: 1.10 Fri May 12 07:36:49 2000

Repository revision: 1.10

/home/xmmom/cvs/master/include/red_sta tic_variables.h,v

File: sci_com.h Status: Locally Modified

Working revision: 1.13 Sat Aug 21 06:54:20 1999

Repository revision: 1.13 /home/xmmom/cvs/master/include/sci_com.h,v

File: sci_ram.h Status: Up - to - date

Working revision: 1. 2 Fri Feb 17 17:11:48 1995

Repository revision: 1.2 /home/xmmom/cvs/master/include/sci_ram.h,v

File: setup.h Status: Up - to - date

Working revision: 1.6 Sat Aug 21 07:05:37 1999

Repository revision: 1.6 /home/xmmom/cvs/master/include/setup. h,v

File: sim_blue_local_ram.h Status: Up - to - date

Working revision: 1.5 Wed Mar 20 18:55:02 1996

Repository revision: 1.5

/home/xmmom/cvs/master/include/sim_blue_local_ram.h,v

File: sun_util.h Status: Up - to - date

Working revision: 1.5 Thu Ju n 13 17:11:34 1996

Repository revision: 1.5 /home/xmmom/cvs/master/include/sun_util.h,v

File: vbtwl.def Status: Up - to - date

Working revision: 1.3 Mon Jul 15 17:58:37 1996

Repository revision: 1.3 /home/xmmom/cvs/master/include/vbtwl.def,v

F ile: vbtwl.h Status: Up - to - date

Working revision: 1.3 Mon Jul 15 17:58:38 1996

Repository revision: 1.3 /home/xmmom/cvs/master/include/vbtwl.h,v

File: white.h Status: Up - to - date

Working revision: 1.15 Wed Dec 9 22:15:41 1998

Repository revision: 1.15 /home/xmmom/cvs/master/include/white.h,v

File: white_buffers.h Status: Up - to - date

Working revision: 1.3 Sat Mar 21 02:02:50 1998

Repository revision: 1.3 /home/xmmom/cvs/master/include/white_buffers.h,v

File: white_contr ol.h Status: Up - to - date

Working revision: 1.15 Fri May 12 07:36:50 2000

Repository revision: 1.15 /home/xmmom/cvs/master/include/white_control.h,v

File: white_crt0_equ.h Status: Up - to - date

Working revision: 1.2 Sat Mar 21 02:02:51 1998

Repos itory revision: 1.2

/home/xmmom/cvs/master/include/white_crt0_equ.h,v

File: white_default.h Status: Up - to - date

Working revision: 1.24 Fri May 12 07:36:50 2000

Repository revision: 1.24 /home/xmmom/cvs/master/include/white_default.h,v

File: white_os _variables.h Status: Up - to - date

Working revision: 1.8 Sat Aug 21 06:58:27 1999

Repository revision: 1.8

/home/xmmom/cvs/master/include/white_os_variables.h,v

File: white_shared_variables.h Status: Up - to - date

Working revision: 1.19 Fri May 12 07:36 :50 2000

Repository revision: 1.19

/home/xmmom/cvs/master/include/white_shared_variables.h,v

File: white_static_variables.h Status: Up - to - date

Working revision: 1.19 Fri May 12 07:36:51 2000

Repository revision: 1.19

/home/xmmom/cvs/master/include /white_static_variables.h,v

File: xmmom_Test_Stack.asm Status: Up - to - date

Working revision: 1.2 Tue Sep 9 15:23:09 1997

Repository revision: 1.2

/home/xmmom/cvs/master/include/xmmom_Test_Stack.asm,v

File: xmmom_std.asm Status: Up - to - date

Work ing revision: 1.6 Wed Dec 9 22:19:29 1998

Repository revision: 1.6 /home/xmmom/cvs/master/include/xmmom_std.asm,v

File: xmmom_std2.asm Status: Up - to - date

Working revision: 1.1 Wed Dec 9 23:21:57 1998

Repository revision: 1.1 /home/xmmom/cvs/m aster/include/xmmom_std2.asm,v

24

Util CVS Module

File: asm_headers Status: Up - to - date

Working revision: 1.2 Fri Feb 20 23:33:17 1998

Repository revision: 1.2

/home/xmmom/cvs/master/dpu/util/bin/asm_headers,v

File: csh0_headers Status: Up - t o - date

Working revision: 1.1 Tue Sep 9 16:51:04 1997

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/bin/csh0_headers,v

File: csh_headers Status: Up - to - date

Working revision: 1.1 Tue Sep 9 16:51:04 1997

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/bin/csh_headers,v

File: get_base Status: Up - to - date

Working revision: 1.3 Wed Sep 16 21:44:53 1998

Repository revision: 1.3 /home/xmmom/cvs/master/dpu/util/bin/get_base,v

File: get_psize Status: Up - to - date

Working revision: 1.1 Tue Sep 9 16:42:53 1997

Repository revision: 1.1 /home/xmmom/cvs/master/dpu/util/bin/get_psize,v

File: make_loader_lut Status: Up - to - date

Working revision: 1.2 Fri Feb 20 23:33:18 1998

Repository revision: 1.2

/ho me/xmmom/cvs/master/dpu/util/bin/make_loader_lut,v

File: makebdsp Status: Up - to - date

Working revision: 1.4 Mon Jul 13 00:26:00 1998

Repository revision: 1.4 /home/xmmom/cvs/master/dpu/util/bin/makebdsp,v

File: makebootrom Status: Up - to - date

Working revision: 1.2 Fri Feb 20 23:33:19 1998

Repository revision: 1.2

/home/xmmom/cvs/master/dpu/util/bin/makebootrom,v

File: makedsp Status: Up - to - date

Working revision: 1.7 Tue Oct 27 16:01:08 1998

Repository revision: 1.7 / home/xmmom/cvs/master/dpu/util/bin/makedsp,v

File: makerdsp Status: Up - to - date

Working revision: 1.5 Mon Jul 13 00:26:02 1998

Repository revision: 1.5 /home/xmmom/cvs/master/dpu/util/bin/makerdsp,v

File: makewdsp Status: Up - to - date

Working revision: 1.4 Mon Jul 13 00:26:02 1998

Repository revision: 1.4 /home/xmmom/cvs/master/dpu/util/bin/makewdsp,v

File: recover_cmd Status: Up - to - date

Working revision: 1.1 Tue Sep 9 16:32:00 1997

Repository revision: 1.1

/home/xmmo m/cvs/master/dpu/util/bin/recover_cmd,v

File: strip_cmd Status: Up - to - date

Working revision: 1.1 Tue Sep 9 16:32:00 1997

Repository revision: 1.1 /home/xmmom/cvs/master/dpu/util/bin/strip_cmd,v

File: vsw_headers Status: Up - to - date

W orking revision: 1.1 Tue Sep 9 16:51:05 1997

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/bin/vsw_headers,v

File: Makefile_asm_headers Status: Up - to - date

Working revision: 1.3 Sat Sep 19 09:06:35 1998

Repository revision: 1.3

/home/xm mom/cvs/master/dpu/util/src/Makefile_asm_headers,v

File: Makefile_blue Status: Up - to - date

Working revision: 1.8 Wed Dec 9 23:07:24 1998

Repository revision: 1.8

/home/xmmom/cvs/master/dpu/util/src/Makefile_blue,v

File: Makefile_red Status: Up - to - date

Working revision: 1.2 Thu Jul 9 17:36:08 1998

Repository revision: 1.2

/home/xmmom/cvs/master/dpu/util/src/Makefile_red,v

File: Makefile_red_bios Status: Up - to - date

Working revision: 1.5 Sat Sep 19 10:21:52 1998

Repository revision: 1.5

/home/xmmom/cvs/master/dpu/util/src/Makefile_red_bios,v

File: Makefile_red_cmd Status: Up - to - date

Working revision: 1.12 Tue Oct 27 15:57:01 1998

25

Repository revision: 1.12

/home/xmmom/cvs/master/dpu/util/src/Makefile_red_cmd,v

File: Makefile_re d_su Status: Up - to - date

Working revision: 1.4 Wed Dec 9 23:07:25 1998

Repository revision: 1.4

/home/xmmom/cvs/master/dpu/util/src/Makefile_red_su,v

File: Makefile_srec Status: Up - to - date

Working revision: 1.8 Wed Dec 9 23:07:25 1998

Re pository revision: 1.8

/home/xmmom/cvs/master/dpu/util/src/Makefile_srec,v

File: Makefile_total_size Status: Up - to - date

Working revision: 1.1 Wed Sep 13 20:11:40 1995

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/Makefile_total_size,v

File: Makefile_white Status: Up - to - date

Working revision: 1.3 Thu Jul 9 17:36:09 1998

Repository revision: 1.3

/home/xmmom/cvs/master/dpu/util/src/Makefile_white,v

File: Makefile_white_bios Status: Up - to - date

Working revision: 1.4 Thu Jun 13 1 7:15:26 1996

Repository revision: 1.4

/home/xmmom/cvs/master/dpu/util/src/Makefile_white_bios,v

File: Makefile_white_boot Status: Up - to - date

Working revision: 1.3 Wed Mar 20 19:20:18 1996

Repository revision: 1.3

/home/xmmom/cvs/master/dpu/util/sr c/Makefile_white_boot,v

File: Makefile_white_cmd Status: Up - to - date

Working revision: 1.13 Tue Oct 27 15:57:47 1998

Repository revision: 1.13

/home/xmmom/cvs/master/dpu/util/src/Makefile_white_cmd,v

File: Makefile_white_su Status: Up - to - date

Worki ng revision: 1.8 Tue Sep 9 17:01:17 1997

Repository revision: 1.8

/home/xmmom/cvs/master/dpu/util/src/Makefile_white_su,v

File: loader.lut.template Status: Up - to - date

Working revision: 1.1 Sun Mar 22 23:02:36 1998

Repository revision: 1.1

/home/x mmom/cvs/master/dpu/util/src/loader.lut.template,v

File: loader.lut.w Status: Up - to - date

Working revision: 1.1 Sun Mar 22 23:02:37 1998

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/loader.lut.w,v

File: red_link_loc.ctl Status: U p - to - date

Working revision: 1.3 Mon May 13 22:41:26 1996

Repository revision: 1.3

/home/xmmom/cvs/master/dpu/util/src/red_link_loc.ctl,v

File: srec.doc Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:51:46 1994

Repository revisi on: 1.1 /home/xmmom/cvs/master/dpu/util/src/srec.doc,v

File: white_link_loc.ctl Status: Up - to - date

Working revision: 1.1 Sun Dec 4 20:11:42 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/white_link_loc.ctl,v

File: blue_split.c Status: Up - to - date

Working revision: 1.2 Sat Feb 19 00:14:41 1994

Repository revision: 1.2

/home/xmmom/cvs/master/dpu/util/src/cc/blue_split.c,v

File: boot_split.c Status: Up - to - date

Working revision: 1.1 Mon May 13 19:51:33 1996

Reposit ory revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/cc/boot_split.c,v

File: cal_checksum.c Status: Up - to - date

Working revision: 1.1 Tue Mar 31 19:37:32 1998

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/cc/cal_checksum.c,v

File: c hange_bit.c Status: Up - to - date

Working revision: 1.1 Sat Sep 19 10:20:34 1998

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/cc/change_bit.c,v

File: cmnder.c Status: Up - to - date

26

Working revision: 1.4 Fri May 10 22:34:57 1996

Repository revision: 1.4

/home/xmmom/cvs/master/dpu/util/src/cc/cmnder.c,v

File: create_loader_lut.c Status: Up - to - date

Working revision: 1.7 Thu Jul 9 17:36:55 1998

Repository revision: 1.7

/home/xmmom/cvs/master/dpu/util/src/cc/create_load er_lut.c,v

File: extract_p.c Status: Up - to - date

Working revision: 1.1 Fri May 12 08:19:03 2000

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/cc/extract_p.c,v

File: sizetest.c Status: Up - to - date

Working revision: 1.1 Sun Dec 4 20:13:24 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/cc/sizetest.c,v

File: srec.c Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:52:30 1994

Repository revision: 1.1 /home/xmmom/cvs/master/dpu/util/s rc/cc/srec.c,v

File: strip_lod.wo_fec Status: Up - to - date

Working revision: 1.3 Thu May 28 20:04:44 1998

Repository revision: 1.3

/home/xmmom/cvs/master/dpu/util/src/cc/strip_lod.wo_fec,v

File: strip_lod_wfec.c Status: Up - to - date

Working revision : 1.1 Fri Feb 20 23:33:47 1998

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/cc/strip_lod_wfec.c,v

File: strip_lod_wofec.c Status: Up - to - date

Working revision: 1.1 Fri Feb 20 23:33:48 1998

Repository revision: 1.1

/home/xmmom/cvs/ma ster/dpu/util/src/cc/strip_lod_wofec.c,v

File: aouthdr.h Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:53:06 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/aouthdr.h,v

File: coreaddr.h Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:53:07 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/coreaddr.h,v

File: dspext.h Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:53:08 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/dspext.h,v

File: fect.h Status: Up - to - date

Working revision: 1.1 Sun Mar 22 23:09:39 1998

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/fect.h,v

File: filehdr.h Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:53:08 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/filehdr.h,v

File: forErrorCorrTable.h Status: Up - to - date

Working revision: 1.1 Sun Mar 22 23:09:40 1998

Rep ository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/forErrorCorrTable.h,v

File: linenum.h Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:53:09 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/lin enum.h,v

File: maout.h Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:53:10 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/maout.h,v

File: reloc.h Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:53:11 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/reloc.h,v

File: scnhdr.h Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:53:12 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/ src/include/scnhdr.h,v

27

File: srec.h Status: Up - to - date

Working revision: 1.2 Tue Sep 9 15:25:45 1997

Repository revision: 1.2

/home/xmmom/cvs/master/dpu/util/src/include/srec.h,v

File: storclas.h Status: Up - to - date

Working revis ion: 1.1 Tue Jan 4 16:53:14 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/storclas.h,v

File: storcls.h Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:53:15 1994

Repository revision: 1.1

/home/xmmom/cvs/ master/dpu/util/src/include/storcls.h,v

File: syms.h Status: Up - to - date

Working revision: 1.1 Tue Jan 4 16:53:16 1994

Repository revision: 1.1

/home/xmmom/cvs/master/dpu/util/src/include/syms.h,v

28

6. LOADABLE CODE

ICU

---

File size:

- rw - r -- r -- 1 heh xray 596727 M ay 11 16:49 oper.hex

MD5 checksum:

10cb5856f589dabec15a7e580d2f950a oper.hex

DPU

---

File sizes:

- rw - r -- r -- 1 pjs1 xray 19900 May 12 08:43 blue_p3.cmd.0

- rw - r -- r -- 1 pjs1 xray 313120 May 12 08:43 p0.cmd.0

- rw - r -- r -- 1 pjs1 xray 86980 May 12 08:43 p5.cmd.0

- rw - r -- r -- 1 pjs1 xray 102060 May 12 08:43 p7.cmd.0

- rw - r -- r -- 1 pjs1 xray 15553 May 12 08:43 blue_p3.p

- rw - r -- r -- 1 pjs1 xray 244474 May 12 08:43 p0.p

- rw - r -- r -- 1 pjs1 x ray 67927 May 12 08:43 p5.p

- rw - r -- r -- 1 pjs1 xray 79701 May 12 08:43 p7.p

MD5 checksums:

8cb330b7a8b14d810bfd490e2a8ad391 blue_p3.cmd.0 e022296cafb7880add191e0d60a5e7be p0.cmd.0

262fbb659435bc8ad0a647047d81fb25 p5.cmd.0

92704ded889 5df20c29f26e54be12f0e p7.cmd.0

4a20a0e8cd9898cdd575b74507d3cbe0 blue_p3.p

2150fb74d861b1fbaf7d41988135905c p0.p

54209cba132c4724293c4aa04bdaacb4 p5.p

8b0add1116defd120a06385f860a90bc p7.p