XMM Optical Monitor

DEPARTMENT OF ASTRONOMY PENNSYLVANIA STATE UNIVERSITY Author: Joe Chavez

A PROPOSED TRANSPUTER IMPLEMENTATION OF THE ^{XMM}OM DPU

DOCUMENT: XMM-OM/PENN/TC/0007.01 20-Dec-90