ID Rosat (0.5–2keV) Hard. Rosat Off (R) Optical (C) ID Offset R mag Class. Class. Z Notes cts/1e4s Flux �10�15 ratio RA (2000) Dec axis RA (2000) Dec (”) flag

[a] [b] [c] [d] [e] [f] [g] [h] [i] [j] [k] [a] [l] [m] [n] [o] [p] [q]

1 420.0 483.0 � 7.0 0.70 � 0.01 13 34 51.473 37 46 19.92 8.81 13 34 51.51 37 46 19.3 1 0.7 13.79 MSTAR * 2 45.0 51.4 � 2.3 ¿7.76 13 34 41.655 38 0 9.10 5.66 R 13 34 41.82 38 00 11.3 2 3.0 18.69 QSO * 0.26 Y 3 25.0 30.6 � 1.8 0.27 � 0.02 13 33 42.320 38 3 34.59 13.87 13 33 42.36 38 3 36.3 3 1.8 18.60 QSO * 1.069 5 22.0 25.0 � 1.6 0.37 � 0.03 13 34 37.718 37 56 5.33 1.53 13 34 38.07 37 56 04.0 5 4.4 20.12 CLU (*) 0.57? Y 7 21.0 23.9 � 1.6 0.30 � 0.02 13 34 17.431 37 57 22.10 4.59 13 34 17.52 37 57 22.4 7 1.1 18.35 QSO * 1.14 9 18.0 22.2 � 1.6 0.16 � 0.01 13 34 27.672 38 9 0.25 14.50 13 34 28.44 38 9 5.7 – 9 10.5 21.49 ? Y 10 17.0 19.4 � 1.5 0.11 � 0.01 13 34 10.639 37 59 55.85 7.31 13 34 10.62 37 59 56.3 10 0.5 19.55 QSO * 0.38 11 17.0 21.1 � 1.6 0.41 � 0.04 13 33 31.979 37 46 39.31 14.93 13 33 32.01 37 46 41.1 11 1.9 20.74 QSO * 0.826 Y 13 15.0 17.3 � 1.4 0.50 � 0.05 13 33 58.579 37 59 35.84 8.91 13 33 58.55 37 59 38.2 13 2.4 21.10 QSO * 1.61 15 14.0 16.0 � 1.4 0.17 � 0.02 13 34 42.499 37 59 16.28 4.84 13 34 42.77 37 59 15.0 15 3.4 19.83 QSO * 1.140 16 14.0 17.0 � 1.5 1.44 � 0.23 13 34 42.163 37 41 45.56 12.90 13 34 42.21 37 41 45.9 – 16 0.7 17.58 MSTAR * 17 14.0 16.1 � 1.4 0.56 � 0.06 13 34 1.034 37 54 1.24 6.92 13 34 01.03 37 54 04.9 17 3.7 21.12 QSO (*) 1.64 Y 18 13.0 15.9 � 1.3 0.57 � 0.06 13 35 44.548 37 51 39.76 13.84 13 35 44.66 37 51 40.8 18 1.7 20.25 QSO * 1.621 20 12.0 14.2 � 1.3 0.35 � 0.04 13 35 30.059 37 57 51.15 11.14 13 35 30.30 37 57 50.0 20 3.1 20.86 QSO * 1.39 21 12.0 13.7 � 1.3 ¿2.07 13 34 31.155 37 48 31.40 6.15 13 34 31.33 37 48 31.4 21 2.1 22.27 QSO * 1.359 23 12.0 14.2 � 1.3 0.22 � 0.02 13 33 44.857 37 57 59.95 10.64 13 33 44.27 37 57 52.6 23 10.1 20.37 QSO (*) 0.97 Y 24 11.0 13.1 � 1.2 ¿1.90 13 35 35.312 37 57 45.06 12.11 13 35 35.48 37 57 46.2 24 2.3 20.21 QSO * 1.63 27 10.0 11.8 � 1.2 1.20 � 0.22 13 34 9.054 38 3 44.47 10.57 13 34 8.74 38 3 49.6 K 27 6.4 14.90 GSTAR * 29 9.7 11.8 � 1.2 0.25 � 0.03 13 35 41.492 37 55 48.18 12.97 13 35 42.51 37 55 41.8 29 13.7 19.30 QSO (*) 1.90 Y 30 9.6 10.9 � 1.1 0.69 � 0.10 13 34 51.736 37 57 45.80 4.43 R 13 34 52.16 37 57 44.8 30 5.1 20.47 QSO * 1.89 Y 31 9.6 10.9 � 1.1 ¿1.66 13 33 55.697 37 52 54.69 8.13 13 33 55.81 37 52 58.6 31 4.2 20.32 QSO * 2.14 32 9.3 11.5 � 1.2 ¿1.60 13 35 24.753 38 5 36.28 14.61 13 35 25.20 38 5 36.4 32 5.3 15.20 NELG * 0.068 Y 34 8.5 9.85 � 1.0 0.86 � 0.15 13 35 14.069 37 49 1.74 9.35 R 13 35 13.78 37 48 56.3 34 6.4 21.16 CLU * 0.595? Y 36 8.0 9.52 � 1.1 1.00 � 0.20 13 34 38.202 38 6 20.70 11.75 R 13 34 38.39 38 6 27.9 K 36 7.5 17.74 G/NELG * 0.235 Y 37 7.7 8.83 � 1.0 0.48 � 0.07 13 34 23.960 37 46 16.10 8.66 13 34 24.57 37 46 15.2 37 7.3 20.11 QSO * 1.570 42 7.3 8.38 � 1.0 ¿1.26 13 35 2.903 37 50 0.46 7.02 13 35 02.53 37 50 11.1 42 11.6 18.89 NELG * 0.368 Y 43 7.3 8.89 � 1.1 0.83 � 0.16 13 33 29.390 37 55 55.56 13.20 R 13 33 29.02 37 55 57.8 43 5.0 20.21 NELG * 0.385 Y 47 6.6 7.52 � 0.91 0.89 � 0.18 13 35 5.423 37 49 54.32 7.47 13 35 06.16 37 49 53.0 47 8.9 18.91 NELG * 0.364 Y 48 6.5 8.01 � 0.99 0.27 � 0.04 13 35 29.050 38 4 26.54 14.36 13 35 29.69 38 4 32.7 48 9.7 19.17 QSO * 0.692 49 6.4 7.34 � 0.92 ¿1.10 13 34 46.814 37 47 52.22 7.06 13 34 46.92 37 47 48.6 49 3.8 21.08 CLU? 0.709 Y 51 5.9 6.80 � 0.92 0.54 � 0.10 13 34 0.153 37 49 10.15 8.92 R 13 34 01.52 37 49 10.1 51 16.1 16.40 NELG (*) 0.062 Y 54 5.7 7.06 � 0.99 ¿0.98 13 33 22.643 37 57 47.84 14.81 – 54 ? Y 55 5.5 6.28 � 0.91 ¿0.95 13 34 47.174 37 59 46.55 5.63 13 34 47.39 37 59 50.0 55 4.4 21.71 QSO * 1.184 56 5.5 6.23 � 0.91 0.39 � 0.07 13 34 44.869 37 57 24.16 3.30 13 34 45.35 37 57 22.8 56 5.8 20.36 QSO * 1.89 Y

Table 3. Part 1 of 3

ID Rosat (0.5–2keV) Hard. Rosat Off (R) Optical (C) ID Offset R mag Class. Class. Z Notes cts/1e4s Flux �10�15 ratio RA (2000) Dec axis RA (2000) Dec (”) flag

[a] [b] [c] [d] [e] [f] [g] [h] [i] [j] [k] [a] [l] [m] [n] [o] [p] [q]

57 5.4 6.43 � 0.95 0.27 � 0.05 13 33 35.512 37 54 11.28 11.94 13 33 35.62 37 54 13.2 57 2.4 21.68 QSO * 1.525 Y 58 5.2 5.91 � 0.91 ¿0.90 13 34 34.001 37 57 3.18 2.48 13 34 34.65 37 57 03.1 58 7.7 18.95 CLU * 0.308 Y 60 5.0 5.71 � 0.91 0.86 � 0.23 13 34 8.863 37 57 5.68 5.90 13 34 08.79 37 57 06.7 60 1.4 22.71 NELG? 0.58? Y 61 4.7 5.72 � 0.85 0.62 � 0.14 13 33 34.866 37 49 16.92 13.19 13 33 34.47 37 49 12.4 61 6.5 19.73 QSO * 3.43 62 4.5 5.20 � 0.81 0.62 � 0.14 13 35 9.321 37 48 21.74 9.06 13 35 09.03 37 48 30.3 62 9.3 18.64 GP/GAL * 0.251 Y 63 4.5 5.36 � 0.83 0.46 � 0.10 13 34 22.272 38 6 16.10 11.98 13 34 22.24 38 6 20.1 K 63 4.0 21.40 QSO * 2.593 64 4.3 4.91 � 0.80 0.36 � 0.07 13 34 14.481 37 51 28.25 5.27 13 34 14.72 37 51 33.2 64 5.8 13.41 GSTAR * 67 4.2 4.78 � 0.80 ¿0.72 13 34 59.897 37 56 28.06 5.07 13 35 0.20 37 56 33.2 67 6.4 19.77 NELG * 0.558 72 3.9 4.48 � 0.80 0.53 � 0.13 13 35 15.285 37 58 35.59 8.71 13 35 15.23 37 58 38.6 72 3.2 21.10 QSO * 2.808 73 3.8 4.31 � 0.79 ¿0.66 13 35 16.986 37 54 18.94 8.09 13 35 17.31 37 54 16.2 73 4.7 23 BLANK Y 74 3.8 4.62 � 0.85 ¿0.66 13 34 7.632 38 6 20.25 13.00 13 34 7.44 38 6 26.5 K 74 6.6 18.81 CLU * 0.382 Y 75 3.7 4.39 � 0.83 ¿0.64 13 35 17.357 38 2 45.69 11.53 13 35 17.59 38 2 47.5 75 3.3 22.09 QSO * 1.38 77 3.6 4.43 � 0.86 0.47 � 0.12 13 35 32.630 37 45 48.99 14.22 13 35 31.85 37 45 36.8 77 15.4 18.13 GRP (*) 0.307 Y 78 3.6 4.46 � 0.87 ¿0.62 13 34 54.048 37 40 11.92 14.84 13 34 52.73 37 40 13.2 – 78 15.7 22.07 ? Y 80 3.6 4.09 � 0.80 0.45 � 0.11 13 34 11.200 37 47 54.64 8.29 13 34 11.25 37 47 57.2 80 2.7 23.03 GAL? 0.327? Y 82 3.4 3.85 � 0.79 ¿0.59 13 35 15.825 37 52 41.12 8.09 82 BLANK Y 84 3.4 4.17 � 0.86 ¿0.59 13 34 39.874 37 40 37.83 13.99 13 34 39.39 37 40 50.3 – 84 13.7 20.13 ? Y 85 3.4 3.88 � 0.80 ¿0.59 13 34 8.400 37 54 42.53 5.44 13 34 8.82 37 54 43.5 85 5.1 20.73 NELG * 0.304 Y 87 3.3 4.05 � 0.86 ¿0.57 13 33 43.019 37 45 18.91 13.99 13 33 41.31 37 45 11.9 – 87 21.5 20.14 BLANK? Y 88 3.3 4.02 � 0.85 0.21 � 0.05 13 33 37.274 37 47 59.68 13.34 13 33 36.80 37 47 46.7 88 14.2 17.29 ? Y 90 3.2 3.86 � 0.72 ¿0.55 13 35 12.578 37 44 18.18 12.58 13 35 12.70 37 44 19.8 – 90 2.2 21.09 QSO? Y 91 3.2 3.77 � 0.71 ¿0.55 13 34 58.096 38 4 26.37 10.76 R 13 34 58.37 38 4 30.3 91 5.1 20.91 QSO * 2.007 92 3.2 3.76 � 0.70 ¿0.55 13 34 0.999 37 46 52.55 10.36 13 34 1.17 37 46 47.9 92 5.0 21.64 QSO * 1.59 93 3.2 3.79 � 0.71 ¿0.55 13 33 53.165 38 2 0.14 11.23 13 33 53.80 38 1 56.0 93 8.6 21.22 NELG * 0.596 Y 94 3.2 3.80 � 0.71 ¿0.55 13 33 46.424 38 0 26.10 11.38 R 13 33 46.07 38 0 25.3 94 4.2 18.87 NELG * 0.061 Y 96 3.1 3.54 � 0.69 ¿0.53 13 34 58.470 37 50 23.22 6.12 R 13 34 57.67 37 50 30.1 96 11.8 19.21 CLU (*) 0.382 Y 97 3.1 3.64 � 0.70 ¿0.53 13 34 36.932 38 5 0.84 10.42 13 34 36.95 38 5 6.8 K 97 6.0 22.72 QSO? Y 98 3.0 3.72 � 0.74 ¿0.52 13 35 37.085 37 45 51.39 14.90 13 35 36.83 37 45 53.0 – 98 3.5 19.00 GAL? (*) 0.255? 99 3.0 3.56 � 0.71 ¿0.52 13 35 3.696 37 44 27.28 11.53 – 99 BLANK Y 100 3.0 3.69 � 0.74 ¿0.52 13 34 51.056 37 40 40.60 14.24 – 100 ? Y 101 3.0 3.43 � 0.69 0.48 � 0.14 13 34 2.495 37 51 29.27 7.31 13 34 2.53 37 51 29.3 101 0.4 20.61 QSO * 1.35 103 3.0 3.70 � 0.74 ¿0.52 13 33 30.866 37 48 6.12 14.41 13 33 31.07 37 48 9.8 103 4.5 19.29 NELG * 0.200 104 2.7 3.07 � 0.68 ¿0.47 13 34 31.630 37 49 58.61 4.70 13 34 31.22 37 49 53.0 104 7.4 21.35 QSO * 1.485 105 2.7 3.34 � 0.74 0.33 � 0.09 13 34 19.003 37 40 18.63 14.68 13 34 19.21 37 40 16.1 – 105 3.5 17.9 GRP? (*) Y

Table 3. Part 2 of 3

ID Rosat (0.5–2keV) Hard. Rosat Off (R) Optical (C) ID Offset R mag Class. Class. Z Notes cts/1e4s Flux �10�15 ratio RA (2000) Dec axis RA (2000) Dec (”) flag

[a] [b] [c] [d] [e] [f] [g] [h] [i] [j] [k] [a] [l] [m] [n] [o] [p] [q]

107 2.7 3.17 � 0.70 ¿0.47 13 33 51.196 37 49 45.69 10.08 13 33 50.97 37 49 35.0 107 11.0 21.58 ? Y 108 2.6 3.20 � 0.74 ¿0.45 13 35 37.472 37 47 11.68 14.22 13 35 37.38 37 47 25.0 108 13.5 20.35 QSO * 0.80 109 2.6 3.07 � 0.71 ¿0.45 13 33 39.871 37 52 26.57 11.28 13 33 40.90 37 52 43.0 109 20.5 20.5 QSO? 2.12 Y 110 2.5 2.95 � 0.71 ¿0.43 13 35 12.133 38 2 42.46 10.79 13 35 12.51 38 2 47.0 110 6.3 21.52 QSO * 1.855 111 2.5 3.03 � 0.73 ¿0.43 13 34 53.191 37 42 12.77 12.84 – 111 BLANK 112 2.5 2.81 � 0.67 ¿0.43 13 34 35.846 37 54 22.69 0.22 13 34 34.62 37 54 29.2 112 16.0 21.76 BLANK? Y 113 2.5 3.04 � 0.73 ¿0.43 13 34 27.637 37 41 35.15 13.12 13 34 27.67 37 41 31.9 – 113 3.3 22.33 ? Y 115 2.4 2.83 � 0.71 ¿0.41 13 35 22.701 37 49 16.55 10.64 13 35 21.46 37 49 17.8 115 14.8 20.23 MSTAR * 116 2.4 2.94 � 0.74 0.29 � 0.09 13 34 54.550 38 8 1.51 13.91 13 34 54.74 38 7 59.5 – 116 3.0 21.95 ? Y 117 2.4 2.81 � 0.70 ¿0.41 13 34 12.613 37 45 35.01 10.13 R 13 34 13.55 37 45 39.0 117 11.9 16.64 NELG * 0.061 118 2.3 2.74 � 0.71 0.26 � 0.08 13 34 23.878 37 42 57.11 11.89 13 34 23.99 37 42 58.3 118 1.8 21.96 QSO * 0.998 119 2.3 2.62 � 0.68 ¿0.40 13 34 14.563 37 52 26.14 4.75 13 34 14.76 37 52 18.3 119 8.2 17.14 KSTAR? Y 120 2.2 2.71 � 0.74 ¿0.38 13 35 19.354 37 43 6.26 14.33 13 35 18.91 37 42 57.3 – 120 10.4 21.70 ? Y 121 2.2 2.50 � 0.68 ¿0.38 13 35 17.911 37 55 32.56 8.32 13 35 18.67 37 55 31.6 121 9.1 19.27 NELG * 0.310 122 2.2 2.69 � 0.73 ¿0.38 13 34 13.493 38 7 12.86 13.37 – 122 ? Y 123 2.2 2.71 � 0.74 ¿0.38 13 34 1.610 37 41 51.46 14.44 13 34 02.04 37 41 32.0 – 123 20.1 20.52 ? Y 124 2.1 2.47 � 0.71 0.25 � 0.08 13 34 21.328 38 4 45.95 10.57 13 34 21.00 38 4 28.6 K 124 17.8 16.36 ? Y 125 2.1 2.49 � 0.71 0.25 � 0.08 13 33 37.145 37 56 37.36 11.78 13 33 37.06 37 56 30.9 125 6.5 21.18 QSO * 1.68 126 2.0 2.39 � 0.72 ¿0.34 13 34 27.852 38 6 44.10 12.24 K 126 ? Y 127 1.9 2.18 � 0.57 ¿0.33 13 34 57.111 37 49 40.15 6.46 R 13 34 57.67 37 49 34.2 127 8.9 20.06 NELG? (*) 0.250 Y 128 1.9 2.29 � 0.60 ¿0.33 13 34 49.840 38 6 54.77 12.61 13 34 49.33 38 6 57.3 – 128 6.5 19.14 GAL? 0.256 Y 129 1.9 2.24 � 0.59 ¿0.33 13 34 19.471 37 44 12.98 10.88 13 34 18.93 37 44 1.4 129 13.2 20.59 NELG * 0.290 Y 130 1.9 2.25 � 0.59 ¿0.33 13 33 43.403 37 50 32.05 11.15 130 BLANK Y 131 1.8 2.09 � 0.58 ¿0.31 13 35 19.279 37 58 24.79 9.35 13 35 18.76 37 58 19.0 131 8.5 22.32 NELG? (*) 0.576 Y 132 1.8 2.05 � 0.57 ¿0.31 13 34 46.319 37 58 44.38 4.61 13 34 46.68 37 58 41.1 132 5.4 18.76 NELG * 0.223 Y 133 1.8 2.14 � 0.59 ¿0.31 13 34 16.158 38 5 32.13 11.61 13 34 16.38 38 5 23.6 K 133 8.9 20.61 QSO? Y 134 1.8 2.10 � 0.58 ¿0.31 13 34 1.062 38 1 28.51 9.73 13 34 2.30 38 1 12.1 134 22.0 20.62 NELG (*) 0.250 Y 135 1.8 2.10 � 0.58 ¿0.31 13 33 47.254 37 54 2.12 9.63 13 33 48.16 37 53 54.1 135 13.4 20.60 NELG (*) 0.522 Y

Table 3. Part 3 of 3