Table 2 N_E / N_H

log p (dynes cm^{−2} sec^{−1}) Temperature -2 -1 0 1 3 -2^∗

8,000 0.8266 0.3320 0.3977 0.2298 0.0680 9,000 0.8611 0.3989 0.6288 0.7121 0.2393 10,000 0.8883 0.4885 0.7587 0.9176 0.5629 11,000 0.9103 0.5870 0.8322 0.9654 0.8431 0.4236 13,000 0.9440 0.7504 0.9076 0.9855 0.9855 0.4236 15,000 0.9702 0.8514 0.9448 0.9920 1.0030 0.6467 22,000 1.0370 0.9970 0.9897 1.0092 1.0457 0.7643 30,000 1.0627 1.0374 1.0318 1.0402 1.0495 0.9712 50,000 1.0506 1.0503 1.0836 1.0294 70,000 1.0653 1.0680 1.0976 100,000 1.0953 1.0955 1.0992

∗The last column are the results for the case with no incident radiation on the slab. The results in the table are for a slab 200 km thick.